X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8795498cd9ec480873e88fccbb63b94be3eddb92..2712e31795ee7ab4de62189b440d702f3f849c0d:/docs/latex/wx/strtotxt.tex?ds=sidebyside

diff --git a/docs/latex/wx/strtotxt.tex b/docs/latex/wx/strtotxt.tex
index 8b0e7de771..b133a26071 100644
--- a/docs/latex/wx/strtotxt.tex
+++ b/docs/latex/wx/strtotxt.tex
@@ -47,6 +47,10 @@ No base class
 
 <wx/textctrl.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxTextCtrl}{wxtextctrl}
@@ -62,7 +66,7 @@ the default parameter value to the text control {\it text}.
 
 \wxheading{Parameters}
 
-\docparam{text}{The text control to append output too, must be non NULL}
+\docparam{text}{The text control to append output too, must be non-NULL}
 
 \docparam{ostr}{The C++ stream to redirect, {\it cout} is used if it is NULL}
 
