X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8795498cd9ec480873e88fccbb63b94be3eddb92..1baa0a9db5e1721dca079ce4f7b1f8e9f2d12e5a:/docs/latex/wx/dialup.tex

diff --git a/docs/latex/wx/dialup.tex b/docs/latex/wx/dialup.tex
index 94df86f20c..fd492047bf 100644
--- a/docs/latex/wx/dialup.tex
+++ b/docs/latex/wx/dialup.tex
@@ -35,6 +35,10 @@ No base class
 
 <wx/dialup.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Event table macros}
 
 To be notified about the change in the network connection status, use these
