X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8795498cd9ec480873e88fccbb63b94be3eddb92..11ef729d54ee338a1d569b5a238c2feb84d488ff:/docs/latex/wx/tlw.tex

diff --git a/docs/latex/wx/tlw.tex b/docs/latex/wx/tlw.tex
index 6cada953fe..812eebd334 100644
--- a/docs/latex/wx/tlw.tex
+++ b/docs/latex/wx/tlw.tex
@@ -148,8 +148,8 @@ action. When in doubt, use the default value.
 Note that this function should normally be only used when the application is
 not already in foreground.
 
-This function is currently only implemented for Win32 where it flashes the
-window icon in the taskbar.
+This function is currently implemented for Win32 where it flashes the
+window icon in the taskbar, and for wxGTK with task bars supporting it.
 
 
 \membersection{wxTopLevelWindow::SetIcon}\label{wxtoplevelwindowseticon}
