X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8771a3239e0ab9b6447ac73c3b00de4b3d7257fe..5824f314a3ac14fb4f4c8c2db7823076fedbbee8:/docs/latex/wx/app.tex

diff --git a/docs/latex/wx/app.tex b/docs/latex/wx/app.tex
index 88b7b8c40f..e894a39d17 100644
--- a/docs/latex/wx/app.tex
+++ b/docs/latex/wx/app.tex
@@ -157,6 +157,12 @@ different visuals, FALSE otherwise.
 
 \helpref{SetUseBestVisual}{wxappsetusebestvisual}
 
+\membersection{wxApp::GetVendorName}\label{wxappgetvendorname}
+
+\constfunc{wxString}{GetVendorName}{\void}
+
+Returns the application's vendor name.
+
 \membersection{wxApp::ExitMainLoop}\label{wxappexitmainloop}
 
 \func{void}{ExitMainLoop}{\void}
@@ -447,6 +453,19 @@ needs to use the top window.
 
 \helpref{wxApp::GetTopWindow}{wxappgettopwindow}, \helpref{wxApp::OnInit}{wxapponinit}
 
+
+\membersection{wxApp::SetVendorName}\label{wxappsetvendorname}
+
+\func{void}{SetVendorName}{\param{const wxString\& }{name}}
+
+Sets the name of application's vendor. The name will be used
+in registry access. A default name is set by
+wxWindows.
+
+\wxheading{See also}
+
+\helpref{wxApp::GetVendorName}{wxappgetvendorname}
+
 \membersection{wxApp::GetStdIcon}\label{wxappgetstdicon}
 
 \func{virtual wxIcon}{GetStdIcon}{\param{int }{which}} const
@@ -476,3 +495,4 @@ This function currently only has effect under GTK.
 \wxheading{Parameters}
 
 \docparam{flag}{If TRUE, the app will use the best visual.}
+
