X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8673a125052b480c4a79772c310586e5eff05bf8..9f8d3f61a913c495ae80c8471ea175ab13cd4613:/docs/latex/wx/rect.tex

diff --git a/docs/latex/wx/rect.tex b/docs/latex/wx/rect.tex
index 44239884dd..b537fd15ac 100644
--- a/docs/latex/wx/rect.tex
+++ b/docs/latex/wx/rect.tex
@@ -142,6 +142,10 @@ Gets the right point of the rectangle.
 
 Gets the size.
 
+\wxheading{See also}
+
+\helpref{wxRect::SetSize}{wxrectsetsize}
+
 
 \membersection{wxRect::GetTop}\label{wxrectgettop}
 
@@ -253,6 +257,17 @@ bottom, otherwise it is moved to the left or top respectively.
 Sets the height.
 
 
+\membersection{wxRect::SetSize}\label{wxrectsetsize}
+
+\func{void}{SetSize}{\param{const wxSize\&}{ s}}
+
+Sets the size.
+
+\wxheading{See also}
+
+\helpref{wxRect::GetSize}{wxrectgetsize}
+
+
 \membersection{wxRect::SetWidth}\label{wxrectsetwidth}
 
 \func{void}{SetWidth}{\param{int}{ width}}
