X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/85ec2f26343b107d32d3821217f47ade57fcadc0..fbdcff4a78e03963d750546b8a74752247b38d40:/docs/latex/wx/nbsizer.tex

diff --git a/docs/latex/wx/nbsizer.tex b/docs/latex/wx/nbsizer.tex
index 4575e9d87b..b4be9489ab 100644
--- a/docs/latex/wx/nbsizer.tex
+++ b/docs/latex/wx/nbsizer.tex
@@ -9,7 +9,7 @@ sizer.
 
 In order to query the size of notebook page, this page needs to have its
 own sizer, otherwise the wxNotebookSizer will ignore it. Notebook pages
-get there sizer by assiging one to them using \helpref{wxWindow::SetSizer}{wxwindowsetsizer}
+get there sizer by assiging one to them using \helpref{wxWindow::SetSizer}{wxwindowsetsizer} 
 and setting the auto-layout option to TRUE using 
 \helpref{wxWindow::SetAutolayout}{wxwindowsetautoLayout}. Here is one
 example showing how to add a notebook page that the notebook sizer is
