X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/85ec2f26343b107d32d3821217f47ade57fcadc0..ddca12cfd9c965963eb63751252000d03a12d9da:/docs/latex/wx/strmmem.tex

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index 6310696d91..64f28a1e5f 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -20,20 +20,32 @@
 % ----------
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxMemoryInputStream::wxMemoryInputStream}
+\membersection{wxMemoryInputStream::wxMemoryInputStream}\label{wxmemoryinputstreamctor}
 
 \func{}{wxMemoryInputStream}{\param{const char *}{ data}, \param{size\_t}{ len}}
 
 Initializes a new read-only memory stream which will use the specified buffer
 {\it data} of length {\it len}. The stream does not take ownership of the 
-buffer, i.e. that it will not delete in its destructor.
+buffer, i.e. the buffer will not be deleted in its destructor.
 
-\membersection{wxMemoryInputStream::\destruct{wxMemoryInputStream}}
+\func{}{wxMemoryInputStream}{\param{const wxMemoryOutputStream&}{ stream}}
+
+Creates a new read-only memory stream, initializing it with the
+data from the given output stream \arg{stream}.
+
+\membersection{wxMemoryInputStream::\destruct{wxMemoryInputStream}}\label{wxmemoryinputstreamdtor}
 
 \func{}{\destruct{wxMemoryInputStream}}{\void}
 
 Destructor.
 
+\membersection{wxMemoryInputStream::GetInputStreamBuffer}\label{wxmemoryinputstreamgetistrmbuf}
+
+\constfunc{wxStreamBuffer *}{GetInputStreamBuffer}{\void}
+
+Returns the pointer to the stream object used as an internal buffer
+for that stream.
+
 % -----------------------------------------------------------------------------
 % wxMemoryOutputStream
 % -----------------------------------------------------------------------------
@@ -56,11 +68,11 @@ Destructor.
 % ----------
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxMemoryOutputStream::wxMemoryOutputStream}
+\membersection{wxMemoryOutputStream::wxMemoryOutputStream}\label{wxmemoryoutputstreamctor}
 
 \func{}{wxMemoryOutputStream}{\param{char *}{ data = NULL}, \param{size\_t}{ length = 0}}
 
-If \it{data} is NULL, then it will initialize a new empty buffer which will
+If {\it data} is NULL, then it will initialize a new empty buffer which will
 grow if required.
 
 \wxheading{Warning}
@@ -68,18 +80,18 @@ grow if required.
 If the buffer is created, it will be destroyed at the destruction of the
 stream.
 
-\membersection{wxMemoryOutputStream::\destruct{wxMemoryOutputStream}}
+\membersection{wxMemoryOutputStream::\destruct{wxMemoryOutputStream}}\label{wxmemoryoutputstreamdtor}
 
 \func{}{\destruct{wxMemoryOutputStream}}{\void}
 
 Destructor.
 
-\membersection{wxMemoryOutputStream::CopyTo}
+\membersection{wxMemoryOutputStream::CopyTo}\label{wxmemoryoutputstreamcopyto}
 
 \constfunc{size\_t}{CopyTo}{\param{char *}{buffer}, \param{size\_t }{len}}
 
 CopyTo allowed you to transfer data from the internal buffer of
-wxMemoryOutputStream to an external buffer. \it{len} specifies the size of
+wxMemoryOutputStream to an external buffer. {\it len} specifies the size of
 the buffer.
 
 \wxheading{Returned value}
@@ -87,3 +99,10 @@ the buffer.
 CopyTo returns the number of bytes copied to the buffer. Generally it is either
 len or the size of the stream buffer.
 
+\membersection{wxMemoryOutputStream::GetOutputStreamBuffer}\label{wxmemoryoutputstreamgetostrmbuf}
+
+\constfunc{wxStreamBuffer *}{GetOutputStreamBuffer}{\void}
+
+Returns the pointer to the stream object used as an internal buffer
+for that stream.
+
