X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/85ec2f26343b107d32d3821217f47ade57fcadc0..93c4157c6cf8603eaba7ebbbc3b1e7bd303d8241:/docs/latex/wx/strmmem.tex

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index 6310696d91..920ad7b36e 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -60,7 +60,7 @@ Destructor.
 
 \func{}{wxMemoryOutputStream}{\param{char *}{ data = NULL}, \param{size\_t}{ length = 0}}
 
-If \it{data} is NULL, then it will initialize a new empty buffer which will
+If {\it data} is NULL, then it will initialize a new empty buffer which will
 grow if required.
 
 \wxheading{Warning}
@@ -79,7 +79,7 @@ Destructor.
 \constfunc{size\_t}{CopyTo}{\param{char *}{buffer}, \param{size\_t }{len}}
 
 CopyTo allowed you to transfer data from the internal buffer of
-wxMemoryOutputStream to an external buffer. \it{len} specifies the size of
+wxMemoryOutputStream to an external buffer. {\it len} specifies the size of
 the buffer.
 
 \wxheading{Returned value}
