X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/85ec2f26343b107d32d3821217f47ade57fcadc0..7eb4e9cc0f3590fffda78bf02c47b25c41583eba:/docs/latex/wx/sizer.tex

diff --git a/docs/latex/wx/sizer.tex b/docs/latex/wx/sizer.tex
index 3d8c05f22c..f0dcb27bcb 100644
--- a/docs/latex/wx/sizer.tex
+++ b/docs/latex/wx/sizer.tex
@@ -23,7 +23,7 @@ the standard font as well as the overall design of Motif widgets requires more s
 on Windows, the intial dialog size will automatically be bigger on Motif than on Windows.
 
 \pythonnote{If you wish to create a sizer class in wxPython you should
-derive the class from \tt{wxPySizer} in order to get Python-aware
+derive the class from {\tt wxPySizer} in order to get Python-aware
 capabilities for the various virtual methods.}
 
 \wxheading{Derived from}
