X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/85ec2f26343b107d32d3821217f47ade57fcadc0..2b004197c8cea40b41632e86cf27857463f985b8:/docs/latex/wx/nbsizer.tex?ds=sidebyside

diff --git a/docs/latex/wx/nbsizer.tex b/docs/latex/wx/nbsizer.tex
index 4575e9d87b..9a9f915704 100644
--- a/docs/latex/wx/nbsizer.tex
+++ b/docs/latex/wx/nbsizer.tex
@@ -9,9 +9,9 @@ sizer.
 
 In order to query the size of notebook page, this page needs to have its
 own sizer, otherwise the wxNotebookSizer will ignore it. Notebook pages
-get there sizer by assiging one to them using \helpref{wxWindow::SetSizer}{wxwindowsetsizer}
+get there sizer by assiging one to them using \helpref{wxWindow::SetSizer}{wxwindowsetsizer} 
 and setting the auto-layout option to TRUE using 
-\helpref{wxWindow::SetAutolayout}{wxwindowsetautoLayout}. Here is one
+\helpref{wxWindow::SetAutoLayout}{wxwindowsetautolayout}. Here is one
 example showing how to add a notebook page that the notebook sizer is
 aware of:
 
