X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/85eb36c267bd325e113ee9e3b84f6b191ed116f2..a8cb1d29e7fe349142d8d6be9fc9afe986340611:/docs/latex/wx/toolbar.tex?ds=inline

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index dee3ddd93c..c348cf28c8 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -648,7 +648,7 @@ Sets the default separator size. The default value is 5.
 
 \func{void}{ToggleTool}{\param{int }{toolIndex}, \param{const bool}{ toggle}}
 
-Toggles a tool on or off.
+Toggles a tool on or off. This does not cause any event to get emitted.
 
 \wxheading{Parameters}
 
