X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8480b297e70a29b785421ded6db22ae024e35038..5824f314a3ac14fb4f4c8c2db7823076fedbbee8:/docs/latex/wx/app.tex

diff --git a/docs/latex/wx/app.tex b/docs/latex/wx/app.tex
index 54648146b3..e894a39d17 100644
--- a/docs/latex/wx/app.tex
+++ b/docs/latex/wx/app.tex
@@ -150,13 +150,19 @@ function will find the first top-level window (frame or dialog) and return that.
 
 \constfunc{bool}{GetUseBestVisual}{\void}
 
-Returns TRUE if the application will use the best visual on system that support
+Returns TRUE if the application will use the best visual on systems that support
 different visuals, FALSE otherwise.
 
 \wxheading{See also}
 
 \helpref{SetUseBestVisual}{wxappsetusebestvisual}
 
+\membersection{wxApp::GetVendorName}\label{wxappgetvendorname}
+
+\constfunc{wxString}{GetVendorName}{\void}
+
+Returns the application's vendor name.
+
 \membersection{wxApp::ExitMainLoop}\label{wxappexitmainloop}
 
 \func{void}{ExitMainLoop}{\void}
@@ -265,7 +271,7 @@ The default handler calls \helpref{wxWindow::Close}{wxwindowclose} with a TRUE a
 
 \wxheading{Remarks}
 
-Under X, OnEndSession is called in response to the 'die' event.
+Under X, OnEndSession is called in response to the `die' event.
 
 Under Windows, OnEndSession is called in response to the WM\_ENDSESSION message.
 
@@ -310,7 +316,7 @@ and vetoes the shutdown if Close returns FALSE. This will be sufficient for many
 
 \wxheading{Remarks}
 
-Under X, OnQueryEndSession is called in response to the 'save session' event.
+Under X, OnQueryEndSession is called in response to the `save session' event.
 
 Under Windows, OnQueryEndSession is called in response to the WM\_QUERYENDSESSION message.
 
@@ -447,6 +453,19 @@ needs to use the top window.
 
 \helpref{wxApp::GetTopWindow}{wxappgettopwindow}, \helpref{wxApp::OnInit}{wxapponinit}
 
+
+\membersection{wxApp::SetVendorName}\label{wxappsetvendorname}
+
+\func{void}{SetVendorName}{\param{const wxString\& }{name}}
+
+Sets the name of application's vendor. The name will be used
+in registry access. A default name is set by
+wxWindows.
+
+\wxheading{See also}
+
+\helpref{wxApp::GetVendorName}{wxappgetvendorname}
+
 \membersection{wxApp::GetStdIcon}\label{wxappgetstdicon}
 
 \func{virtual wxIcon}{GetStdIcon}{\param{int }{which}} const
@@ -464,9 +483,9 @@ can be overridden by the user to change the default icons.
 \func{void}{SetUseBestVisual}{\param{bool}{ flag}}
 
 Allows the programmer to specify whether the application will use the best visual
-on system that support several visual on the same display. This is typically the
-case under Solaris and IRIX, where the default visual is only 8-bit but some apps
-are supposed to run in TrueColour mode.
+on systems that support several visual on the same display. This is typically the
+case under Solaris and IRIX, where the default visual is only 8-bit whereas certain
+appications are supposed to run in TrueColour mode.
 
 Note that this function has to be called in the constructor of the {\tt wxApp}
 instance and won't have any effect when called later on.
@@ -476,3 +495,4 @@ This function currently only has effect under GTK.
 \wxheading{Parameters}
 
 \docparam{flag}{If TRUE, the app will use the best visual.}
+
