X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8461e4c253d4cec65e8f0320246a56d22555eb5e..a84ece11fffdde5d1bbd254ba58ac3cee79c2e77:/docs/latex/wx/app.tex?ds=sidebyside

diff --git a/docs/latex/wx/app.tex b/docs/latex/wx/app.tex
index 2a3ba6fb0e..00aff20c0c 100644
--- a/docs/latex/wx/app.tex
+++ b/docs/latex/wx/app.tex
@@ -424,7 +424,6 @@ Under Windows, OnQueryEndSession is called in response to the WM\_QUERYENDSESSIO
 \wxheading{See also}
 
 \helpref{wxWindow::Close}{wxwindowclose},\rtfsp
-\helpref{wxWindow::OnCloseWindow}{wxwindowonclosewindow},\rtfsp
 \helpref{wxCloseEvent}{wxcloseevent}
 %% GD: OnXXX functions are not documented
 %%\helpref{wxApp::OnEndSession}{wxapponendsession}
@@ -482,7 +481,6 @@ If TRUE is returned, more OnIdle processing is requested by one or more window.
 
 %% GD: OnXXX functions are not documented
 %%\helpref{wxApp::OnIdle}{wxapponidle}
-\helpref{wxWindow::OnIdle}{wxwindowonidle},\rtfsp
 \helpref{wxIdleEvent}{wxidleevent}
 
 \membersection{wxApp::SetAppName}\label{wxappsetappname}
@@ -571,20 +569,6 @@ wxWindows.
 
 \helpref{wxApp::GetVendorName}{wxappgetvendorname}
 
-\membersection{wxApp::GetStdIcon}\label{wxappgetstdicon}
-
-\func{virtual wxIcon}{GetStdIcon}{\param{int }{which}} const
-
-Returns the icons used by wxWindows internally, e.g. the ones used for 
-message boxes.  This function is used internally and 
-can be overridden by the user to change the default icons.
-
-\wxheading{Parameters}
-
-\docparam{which}{One of the wxICON\_XXX specifies which icon to return.}
-
-See \helpref{wxMessageBox}{wxmessagebox} for a list of icon identifiers.
-
 \membersection{wxApp::SetUseBestVisual}\label{wxappsetusebestvisual}
 
 \func{void}{SetUseBestVisual}{\param{bool}{ flag}}
@@ -603,7 +587,7 @@ This function currently only has effect under GTK.
 
 \docparam{flag}{If TRUE, the app will use the best visual.}
 
-\membersection{wxApp::Yield}{wxappyield}
+\membersection{wxApp::Yield}\label{wxappyield}
 
 \func{bool}{Yield}{\param{bool}{ onlyIfNeeded = FALSE}}
 
