X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/8443e0d2cf597a69dd413b0d60616ca1cca8062c..598d8cacefaa185a962ebc39d31533410692c56b:/docs/latex/wx/sizeevt.tex

diff --git a/docs/latex/wx/sizeevt.tex b/docs/latex/wx/sizeevt.tex
index 361b9ac49f..e9f78d76a1 100644
--- a/docs/latex/wx/sizeevt.tex
+++ b/docs/latex/wx/sizeevt.tex
@@ -13,6 +13,19 @@
 
 A size event holds information about size change events.
 
+The EVT\_SIZE handler function will be called when the window has been resized.
+
+You may wish to use this for frames to resize their child windows as appropriate.
+
+Note that the size passed is of
+the whole window: call \helpref{wxWindow::GetClientSize}{wxwindowgetclientsize} for the area which may be
+used by the application.
+
+When a window is resized, usually only a small part of the window is damaged and you
+may only need to repaint that area. However, if your drawing depends on the size of the window,
+you may need to clear the DC explicitly and repaint the whole window. In which case, you
+may need to call \helpref{wxWindow::Refresh}{wxwindowrefresh} to invalidate the entire window.
+
 \wxheading{Derived from}
 
 \helpref{wxEvent}{wxevent}\\
