X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/81d66cf39f810503baed79213bc3122fda0ccc7b..f6081a0462089eaa1da4d38b260af032b349a041:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 965e30bc28..924eb542d2 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -8,6 +8,16 @@ be variable length according to the size of the window.
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Derived from}
+
+\helpref{wxWindow}{wxwindow}\\
+\helpref{wxEvtHandler}{wxevthandler}\\
+\helpref{wxObject}{wxobject}
+
+\wxheading{Include files}
+
+<wx/statusbr.h>
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -235,11 +245,14 @@ field must be -1. You should delete this array after calling {\bf SetStatusWidth
 \wxheading{Remarks}
 
 The widths of the variable fields are calculated from the total width of all fields,
-minus the sum of widths of the non-variable fields, divided by the number of 
+minus the sum of widths of the non-variable fields, divided by the number of
 variable fields.
 
 \wxheading{See also}
 
 \helpref{wxStatusBar::SetFieldsCount}{wxstatusbarsetfieldscount}, \helpref{wxFrame::SetStatusWidths}{wxframesetstatuswidths}
 
+\pythonnote{Only a single parameter is required, a Python list of
+integers.}
+
 
