X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/81d66cf39f810503baed79213bc3122fda0ccc7b..dc9e1e56917ad9b448bd0087a2d1ae3c632c4db1:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index 28468766b0..701b3f3c36 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -226,7 +226,7 @@ Enables or disables the tool.
 
 \wxheading{Remarks}
 
-For \helpref{wxToolBarSimple}{wxtoolbarsimple}, does nothing. Some other implementations
+For wxToolBarSimple, does nothing. Some other implementations
 will change the visible state of the tool to indicate that it is disabled.
 
 \wxheading{See also}
