X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/802fa22622ff0e179592b70aab49052f621144f3..81c882b613b5d99ddb1e5ab69fcd7ebccc287025:/docs/latex/wx/mbcnvfil.tex?ds=sidebyside

diff --git a/docs/latex/wx/mbcnvfil.tex b/docs/latex/wx/mbcnvfil.tex
index 2ed8c847df..fc3f3d8388 100644
--- a/docs/latex/wx/mbcnvfil.tex
+++ b/docs/latex/wx/mbcnvfil.tex
@@ -1,8 +1,3 @@
-%
-% automatically generated by HelpGen from
-% ../include/wx/strconv.h at 25/Mar/00 10:20:56
-%
-
 \section{\class{wxMBConvFile}}\label{wxmbconvfile}
 
 This class used to define the class instance 
@@ -12,9 +7,9 @@ either of type wxConvLibc (on most platforms) or wxConvUTF8
 filesystem multibyte encoding and Unicode. {\bf wxConvFileName} 
 can also be set to a something else at run-time which is used 
 e.g. by wxGTK to use a class which checks the environment 
-variable {\bf G_FILESYSTEM_ENCODING} indicating that filenames 
+variable {\bf G\_FILESYSTEM\_ENCODING} indicating that filenames 
 should not be interpreted as UTF8 and also for converting 
-invalid UTF8 characters (e.g. if there is a filename in iso8859_1)
+invalid UTF8 characters (e.g. if there is a filename in iso8859\_1)
 to strings with octal values. 
 
 Since some platforms (such as Win32) use Unicode in the filenames,
