X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7ef8bfc4c75374ffd4de538cdeaa0f81b69bf61f..1c0f361be288df133c766e04cc857b3e4682b31a:/docs/latex/wx/button.tex

diff --git a/docs/latex/wx/button.tex b/docs/latex/wx/button.tex
index 043d6d9d5e..92dcfb225f 100644
--- a/docs/latex/wx/button.tex
+++ b/docs/latex/wx/button.tex
@@ -20,11 +20,12 @@ almost any other window.
 
 \twocolwidtha{5cm}%
 \begin{twocollist}\itemsep=0pt
-\twocolitem{\windowstyle{wxBU\_LEFT}}{Left-justifies the label. WIN32 only.}
-\twocolitem{\windowstyle{wxBU\_TOP}}{Aligns the label to the top of the button. WIN32 only.}
-\twocolitem{\windowstyle{wxBU\_RIGHT}}{Right-justifies the bitmap label. WIN32 only.}
-\twocolitem{\windowstyle{wxBU\_BOTTOM}}{Aligns the label to the bottom of the button. WIN32 only.}
+\twocolitem{\windowstyle{wxBU\_LEFT}}{Left-justifies the label. Windows only.}
+\twocolitem{\windowstyle{wxBU\_TOP}}{Aligns the label to the top of the button. Windows only.}
+\twocolitem{\windowstyle{wxBU\_RIGHT}}{Right-justifies the bitmap label. Windows only.}
+\twocolitem{\windowstyle{wxBU\_BOTTOM}}{Aligns the label to the bottom of the button. Windows only.}
 \twocolitem{\windowstyle{wxBU\_EXACTFIT}}{Creates the button as small as possible instead of making it of the standard size (which is the default behaviour ).}
+\twocolitem{\windowstyle{wxNO\_BORDER}}{Creates a flat button. Windows and GTK+ only.}
 \end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
@@ -133,7 +134,7 @@ Note that under Motif, calling this function immediately after
 creation of a button and before the creation of other buttons
 will cause misalignment of the row of buttons, since default
 buttons are larger. To get around this, call {\it SetDefault}\rtfsp
-after you have created a row of buttons: wxWindows will
+after you have created a row of buttons: wxWidgets will
 then set the size of all buttons currently on the panel to
 the same size.
 
