X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7e1897c067ddb8218e05e0751cfe3e0521a5bfba..c266eff98c5e44012647f54f38a1e29ecabd8759:/docs/latex/wx/progdlg.tex

diff --git a/docs/latex/wx/progdlg.tex b/docs/latex/wx/progdlg.tex
index 1c98623d11..2798c7be8a 100644
--- a/docs/latex/wx/progdlg.tex
+++ b/docs/latex/wx/progdlg.tex
@@ -19,6 +19,7 @@ the elapsed, remaining and estimated time for the end of the progress.
 \wxheading{Derived from}
 
 \helpref{wxDialog}{wxdialog}\\
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
