X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7ddef9ed7a3f6181086eed376261649f4b3655db..cd9da200285e3c625be91768c9ca61dc218c94d0:/docs/latex/wx/locale.tex

diff --git a/docs/latex/wx/locale.tex b/docs/latex/wx/locale.tex
index e791430e57..f098360397 100644
--- a/docs/latex/wx/locale.tex
+++ b/docs/latex/wx/locale.tex
@@ -43,7 +43,7 @@ catalogs to platform's native encoding. Note that it will do only basic
 conversion between well-known pair like iso8859-1 and windows-1252 or
 iso8859-2 and windows-1250. 
 See \helpref{Writing non-English applications}{nonenglishoverview} for detailed
-description about this behaviour.
+description of this behaviour.
 \end{itemize}
 
 The call of this function has several global side effects which you should
