X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7d2beb15bbcc32aafabc01fe4d186ce07fd007e7..804eeca5d59fc4d3822b719dee61a9d491e6bcfc:/docs/latex/wx/tevent.tex

diff --git a/docs/latex/wx/tevent.tex b/docs/latex/wx/tevent.tex
index 282cde947f..0841732791 100644
--- a/docs/latex/wx/tevent.tex
+++ b/docs/latex/wx/tevent.tex
@@ -268,9 +268,9 @@ defining the appropriate event table, and then call
 \rtfsp\helpref{wxWindow::SetEventHandler}{wxwindowseteventhandler} (or, preferably,
 \rtfsp\helpref{wxWindow::PushEventHandler}{wxwindowpusheventhandler}) to make this
 event handler the object that responds to events. This way, you can avoid
-a lot of class derivation, and use the same event handler class (but different
+a lot of class derivation, and use instances of the same event handler class (but different
 objects as the same event handler object shouldn't be used more than once) to
-handle events from instances of different classes. If you ever have to call a window's event handler
+handle events from instances of different widget classes. If you ever have to call a window's event handler
 manually, use the GetEventHandler function to retrieve the window's event handler and use that
 to call the member function. By default, GetEventHandler returns a pointer to the window itself
 unless an application has redirected event handling using SetEventHandler or PushEventHandler.
@@ -544,7 +544,7 @@ public:
         { return m_curve; }
 
     // required for sending with wxPostEvent()
-    wxEvent* Clone();
+    virtual wxEvent *Clone() const;
 
 private:
     wxPlotCurve   *m_curve;
