X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7d2946d285c11f5cf187db418c2e6093100af7a7..5d1902d6d6efc842c8f488520d3cca40f1ae99f8:/docs/latex/wx/url.tex

diff --git a/docs/latex/wx/url.tex b/docs/latex/wx/url.tex
index bc3fe3f15b..91e6ceff73 100644
--- a/docs/latex/wx/url.tex
+++ b/docs/latex/wx/url.tex
@@ -59,7 +59,7 @@ Returns the last error. This error refers to the URL parsing or to the protocol.
 It can be one of these errors:
 
 \twocolwidtha{7cm}
-\begin{twocollist}\itemsep=0pt
+\begin{twocollist}\itemsep=0pt%
 \twocolitem{{\bf wxURL\_NOERR}}{No error.}
 \twocolitem{{\bf wxURL\_SNTXERR}}{Syntax error in the URL string.}
 \twocolitem{{\bf wxURL\_NOPROTO}}{Found no protocol which can get this URL.}
@@ -86,7 +86,8 @@ Returns the initialized stream. You will have to delete it yourself.
 
 \wxheading{See also}
 
-\helpref{wxInputStream}{wxinputstream}
+%\helpref{wxInputStream}{wxinputstream}
+wxInputStream
 
 %
 % SetDefaultProxy
