X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7c4157904f3d113a0d2b6e6bf71f6ccb0606b42d..9ef63a4a59eccce6cd8787f0ed966bfa8365a22e:/docs/latex/wx/snglinst.tex?ds=sidebyside

diff --git a/docs/latex/wx/snglinst.tex b/docs/latex/wx/snglinst.tex
index 4e4f3cce62..89d874b1b6 100644
--- a/docs/latex/wx/snglinst.tex
+++ b/docs/latex/wx/snglinst.tex
@@ -52,8 +52,6 @@ system call only.
 
 No base class
 
-\wxheading{Data structures}
-
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxSingleInstanceChecker::wxSingleInstanceChecker}\label{wxsingleinstancecheckerctor}
@@ -80,7 +78,7 @@ had been used is an error.
 
 \wxheading{Parameters}
 
-\docparam{name}{must be given and be as unique as possible, it is used as the
+\docparam{name}{must be given and be as unique as possible. It is used as the
 mutex name under Win32 and the lock file name under Unix. 
 \helpref{GetAppName()}{wxappgetappname} may be a good value for this parameter}
 
