X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7bcb11d30764df47144189e164f53d8171ed4a63..f6ed38239c20927281363f3828323e05b4917c0e:/docs/latex/wx/postscpt.tex

diff --git a/docs/latex/wx/postscpt.tex b/docs/latex/wx/postscpt.tex
index b1bd9adda5..68ef4d111f 100644
--- a/docs/latex/wx/postscpt.tex
+++ b/docs/latex/wx/postscpt.tex
@@ -35,11 +35,18 @@ get PostScript printing settings.
 This constructor and the global printer settings are now deprecated;
 use the wxPrintData constructor instead.
 
-\membersection{wxPostScriptDC::GetStream}
 
-\func{ostream *}{GetStream}{\void}
+\membersection{wxPostScriptDC::SetResolution}\label{wxpostscriptdcsetresolution}
 
-Returns the stream currently being used to write PostScript output. Use this
-to insert any PostScript code that is outside the scope of wxPostScriptDC.
+\func{static void}{SetResolution}{\param{int}{ ppi}}
 
+Set resolution (in pixels per inch) that will be used in PostScript
+output. Default is 720ppi.
+
+\membersection{wxPostScriptDC::GetResolution}\label{wxpostscriptdcgetresolution}
+
+\func{static int}{GetResolution}{\void}
+
+Return resolution used in PostScript output. See 
+\helpref{SetResolution}{wxpostscriptdcsetresolution}.
 
