X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7bcb11d30764df47144189e164f53d8171ed4a63..78cd9c69eb3f4c158fe10ce49325d57ec05d1306:/docs/latex/wx/print.tex

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index ba16f85b95..b3a562a06d 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -14,8 +14,13 @@ between the print dialogs and the application.
 
 <wx/cmndata.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
+\helpref{Printing framework overview}{printingoverview}, 
 \helpref{wxPrintDialog}{wxprintdialog}, 
 \helpref{wxPageSetupDialog}{wxpagesetupdialog}, 
 \helpref{wxPrintDialogData}{wxprintdialogdata}, 
@@ -58,7 +63,8 @@ void SetPrintMode(wxPrintMode printMode) ;
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrintData::wxPrintData}
+
+\membersection{wxPrintData::wxPrintData}\label{wxprintdatactor}
 
 \func{}{wxPrintData}{\void}
 
@@ -68,23 +74,37 @@ Default constructor.
 
 Copy constructor.
 
-\membersection{wxPrintData::\destruct{wxPrintData}}
+
+\membersection{wxPrintData::\destruct{wxPrintData}}\label{wxprintdatadtor}
 
 \func{}{\destruct{wxPrintData}}{\void}
 
 Destructor.
 
+
 \membersection{wxPrintData::GetCollate}\label{wxprintdatagetcollate}
 
 \constfunc{bool}{GetCollate}{\void}
 
-Returns TRUE if collation is on.
+Returns true if collation is on.
+
+
+\membersection{wxPrintData::GetBin}\label{wxprintdatagetbin}
+
+\constfunc{wxPrintBin}{GetBin}{\void}
+
+Returns the current bin (papersource). By default, the system is left to select
+the bin (\texttt{wxPRINTBIN\_DEFAULT} is returned).
+
+See \helpref{SetBin()}{wxprintdatasetbin} for the full list of bin values.
+
 
 \membersection{wxPrintData::GetColour}\label{wxprintdatagetcolour}
 
 \constfunc{bool}{GetColour}{\void}
 
-Returns TRUE if colour printing is on.
+Returns true if colour printing is on.
+
 
 \membersection{wxPrintData::GetDuplex}\label{wxprintdatagetduplex}
 
@@ -92,24 +112,28 @@ Returns TRUE if colour printing is on.
 
 Returns the duplex mode. One of wxDUPLEX\_SIMPLEX, wxDUPLEX\_HORIZONTAL, wxDUPLEX\_VERTICAL.
 
+
 \membersection{wxPrintData::GetNoCopies}\label{wxprintdatagetnocopies}
 
 \constfunc{int}{GetNoCopies}{\void}
 
 Returns the number of copies requested by the user.
 
+
 \membersection{wxPrintData::GetOrientation}\label{wxprintdatagetorientation}
 
 \constfunc{int}{GetOrientation}{\void}
 
 Gets the orientation. This can be wxLANDSCAPE or wxPORTRAIT.
 
+
 \membersection{wxPrintData::GetPaperId}\label{wxprintdatagetpaperid}
 
 \constfunc{wxPaperSize}{GetPaperId}{\void}
 
 Returns the paper size id. For more information, see \helpref{wxPrintData::SetPaperId}{wxprintdatasetpaperid}.
 
+
 \membersection{wxPrintData::GetPrinterName}\label{wxprintdatagetprintername}
 
 \constfunc{const wxString\&}{GetPrinterName}{\void}
@@ -117,53 +141,101 @@ Returns the paper size id. For more information, see \helpref{wxPrintData::SetPa
 Returns the printer name. If the printer name is the empty string, it indicates that the default
 printer should be used.
 
+
 \membersection{wxPrintData::GetQuality}\label{wxprintdatagetquality}
 
-\constfunc{wxPaperQuality}{GetQuality}{\void}
+\constfunc{wxPrintQuality}{GetQuality}{\void}
 
 Returns the current print quality. This can be a positive integer, denoting the number of dots per inch, or
 one of the following identifiers:
 
 \begin{verbatim}
-wxPRINT\_QUALITY\_HIGH
-wxPRINT\_QUALITY\_MEDIUM
-wxPRINT\_QUALITY\_LOW
-wxPRINT\_QUALITY\_DRAFT
+wxPRINT_QUALITY_HIGH
+wxPRINT_QUALITY_MEDIUM
+wxPRINT_QUALITY_LOW
+wxPRINT_QUALITY_DRAFT
 \end{verbatim}
 
 On input you should pass one of these identifiers, but on return you may get back a positive integer
 indicating the current resolution setting.
 
+
+\membersection{wxPrintData::IsOk}\label{wxprintdataisok}
+
+\constfunc{bool}{IsOk}{\void}
+
+Returns true if the print data is valid for using in print dialogs.
+This can return false on Windows if the current printer is not set, for example.
+On all other platforms, it returns true.
+
+
+\membersection{wxPrintData::SetBin}\label{wxprintdatasetbin}
+
+\func{void}{SetBin}{\param{wxPrintBin }{flag}}
+
+Sets the current bin. Possible values are:
+
+\small{
+\begin{verbatim}
+enum wxPrintBin
+{
+    wxPRINTBIN_DEFAULT,
+
+    wxPRINTBIN_ONLYONE,
+    wxPRINTBIN_LOWER,
+    wxPRINTBIN_MIDDLE,
+    wxPRINTBIN_MANUAL,
+    wxPRINTBIN_ENVELOPE,
+    wxPRINTBIN_ENVMANUAL,
+    wxPRINTBIN_AUTO,
+    wxPRINTBIN_TRACTOR,
+    wxPRINTBIN_SMALLFMT,
+    wxPRINTBIN_LARGEFMT,
+    wxPRINTBIN_LARGECAPACITY,
+    wxPRINTBIN_CASSETTE,
+    wxPRINTBIN_FORMSOURCE,
+
+    wxPRINTBIN_USER,
+};
+\end{verbatim}
+}
+
+
 \membersection{wxPrintData::SetCollate}\label{wxprintdatasetcollate}
 
 \func{void}{SetCollate}{\param{bool }{flag}}
 
 Sets collation to on or off.
 
+
 \membersection{wxPrintData::SetColour}\label{wxprintdatasetcolour}
 
 \func{void}{SetColour}{\param{bool }{flag}}
 
 Sets colour printing on or off.
 
+
 \membersection{wxPrintData::SetDuplex}\label{wxprintdatasetduplex}
 
 \func{void}{SetDuplex}{\param{wxDuplexMode}{ mode}}
 
 Returns the duplex mode. One of wxDUPLEX\_SIMPLEX, wxDUPLEX\_HORIZONTAL, wxDUPLEX\_VERTICAL.
 
+
 \membersection{wxPrintData::SetNoCopies}\label{wxprintdatasetnocopies}
 
 \func{void}{SetNoCopies}{\param{int }{n}}
 
 Sets the default number of copies to be printed out.
 
+
 \membersection{wxPrintData::SetOrientation}\label{wxprintdatasetorientation}
 
 \func{void}{SetOrientation}{\param{int }{orientation}}
 
 Sets the orientation. This can be wxLANDSCAPE or wxPORTRAIT.
 
+
 \membersection{wxPrintData::SetPaperId}\label{wxprintdatasetpaperid}
 
 \func{void}{SetPaperId}{\param{wxPaperSize}{ paperId}}
@@ -247,6 +319,7 @@ Windows 95 only:
 \end{verbatim}
 }
 
+
 \membersection{wxPrintData::SetPrinterName}\label{wxprintdatasetprintername}
 
 \func{void}{SetPrinterName}{\param{const wxString\& }{printerName}}
@@ -254,23 +327,25 @@ Windows 95 only:
 Sets the printer name. This can be the empty string to indicate that the default
 printer should be used.
 
+
 \membersection{wxPrintData::SetQuality}\label{wxprintdatasetquality}
 
-\func{void}{SetQuality}{\param{wxPaperQuality}{ quality}}
+\func{void}{SetQuality}{\param{wxPrintQuality}{ quality}}
 
 Sets the desired print quality. This can be a positive integer, denoting the number of dots per inch, or
 one of the following identifiers:
 
 \begin{verbatim}
-wxPRINT\_QUALITY\_HIGH
-wxPRINT\_QUALITY\_MEDIUM
-wxPRINT\_QUALITY\_LOW
-wxPRINT\_QUALITY\_DRAFT
+wxPRINT_QUALITY_HIGH
+wxPRINT_QUALITY_MEDIUM
+wxPRINT_QUALITY_LOW
+wxPRINT_QUALITY_DRAFT
 \end{verbatim}
 
 On input you should pass one of these identifiers, but on return you may get back a positive integer
 indicating the current resolution setting.
 
+
 \membersection{wxPrintData::operator $=$}\label{wxprintdataassign}
 
 \func{void}{operator $=$}{\param{const wxPrintData\&}{ data}}
@@ -291,6 +366,7 @@ a successfully dismissed print dialog.
 \wxheading{Derived from}
 
 \helpref{wxDialog}{wxdialog}\\
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
@@ -299,13 +375,19 @@ a successfully dismissed print dialog.
 
 <wx/printdlg.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
+\helpref{Printing framework overview}{printingoverview}, 
 \helpref{wxPrintDialog Overview}{wxprintdialogoverview}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrintDialog::wxPrintDialog}
+
+\membersection{wxPrintDialog::wxPrintDialog}\label{wxprintdialogctor}
 
 \func{}{wxPrintDialog}{\param{wxWindow* }{parent}, \param{wxPrintDialogData* }{data = NULL}}
 
@@ -316,19 +398,22 @@ data, which will be copied to the print dialog's print data.
 
 \helpref{wxPrintDialogData}{wxprintdialogdata}
 
-\membersection{wxPrintDialog::\destruct{wxPrintDialog}}
+
+\membersection{wxPrintDialog::\destruct{wxPrintDialog}}\label{wxprintdialogdtor}
 
 \func{}{\destruct{wxPrintDialog}}{\void}
 
 Destructor. If wxPrintDialog::GetPrintDC has {\it not} been called,
 the device context obtained by the dialog (if any) will be deleted.
 
+
 \membersection{wxPrintDialog::GetPrintDialogData}\label{wxprintdialoggetprintdialogdata}
 
 \func{wxPrintDialogData\&}{GetPrintDialogData}{\void}
 
 Returns the \helpref{print dialog data}{wxprintdialogdata} associated with the print dialog.
 
+
 \membersection{wxPrintDialog::GetPrintDC}\label{wxprintdialoggetprintdc}
 
 \func{wxDC* }{GetPrintDC}{\void}
@@ -338,6 +423,7 @@ When this function has been called, the ownership of the device context
 is transferred to the application, so it must then be deleted
 explicitly.
 
+
 \membersection{wxPrintDialog::ShowModal}\label{wxprintdialogshowmodal}
 
 \func{int}{ShowModal}{\void}
@@ -359,13 +445,20 @@ It contains a wxPrintData object with underlying printing settings.
 
 <wx/cmndata.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
-\helpref{wxPrintDialog}{wxprintdialog}, \helpref{wxPrintDialog Overview}{wxprintdialogoverview}
+\helpref{Printing framework overview}{printingoverview}, 
+\helpref{wxPrintDialog}{wxprintdialog}, 
+\helpref{wxPrintDialog Overview}{wxprintdialogoverview}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrintDialogData::wxPrintDialogData}
+
+\membersection{wxPrintDialogData::wxPrintDialogData}\label{wxprintdialogdatactor}
 
 \func{}{wxPrintDialogData}{\void}
 
@@ -379,47 +472,55 @@ Copy constructor.
 
 Construct an object from a print dialog data object.
 
-\membersection{wxPrintDialogData::\destruct{wxprintdialogdata}}
+
+\membersection{wxPrintDialogData::\destruct{wxPrintDialogData}}\label{wxprintdialogdatadtor}
 
 \func{}{\destruct{wxPrintDialogData}}{\void}
 
 Destructor.
 
+
 \membersection{wxPrintDialogData::EnableHelp}\label{wxprintdialogdataenablehelp}
 
 \func{void}{EnableHelp}{\param{bool }{flag}}
 
 Enables or disables the `Help' button.
 
+
 \membersection{wxPrintDialogData::EnablePageNumbers}\label{wxprintdialogdataenablepagenumbers}
 
 \func{void}{EnablePageNumbers}{\param{bool }{flag}}
 
 Enables or disables the `Page numbers' controls.
 
+
 \membersection{wxPrintDialogData::EnablePrintToFile}\label{wxprintdialogdataenableprinttofile}
 
 \func{void}{EnablePrintToFile}{\param{bool }{flag}}
 
 Enables or disables the `Print to file' checkbox.
 
+
 \membersection{wxPrintDialogData::EnableSelection}\label{wxprintdialogdataenableselection}
 
 \func{void}{EnableSelection}{\param{bool }{flag}}
 
 Enables or disables the `Selection' radio button.
 
+
 \membersection{wxPrintDialogData::GetAllPages}\label{wxprintdialogdatagetallpages}
 
 \constfunc{bool}{GetAllPages}{\void}
 
-Returns TRUE if the user requested that all pages be printed.
+Returns true if the user requested that all pages be printed.
+
 
 \membersection{wxPrintDialogData::GetCollate}\label{wxprintdialogdatagetcollate}
 
 \constfunc{bool}{GetCollate}{\void}
 
-Returns TRUE if the user requested that the document(s) be collated.
+Returns true if the user requested that the document(s) be collated.
+
 
 \membersection{wxPrintDialogData::GetFromPage}\label{wxprintdialogdatagetfrompage}
 
@@ -427,35 +528,49 @@ Returns TRUE if the user requested that the document(s) be collated.
 
 Returns the {\it from} page number, as entered by the user.
 
+
 \membersection{wxPrintDialogData::GetMaxPage}\label{wxprintdialogdatagetmaxpage}
 
 \constfunc{int}{GetMaxPage}{\void}
 
 Returns the {\it maximum} page number.
 
+
 \membersection{wxPrintDialogData::GetMinPage}\label{wxprintdialogdatagetminpage}
 
 \constfunc{int}{GetMinPage}{\void}
 
 Returns the {\it minimum} page number.
 
+
 \membersection{wxPrintDialogData::GetNoCopies}\label{wxprintdialogdatagetnocopies}
 
 \constfunc{int}{GetNoCopies}{\void}
 
 Returns the number of copies requested by the user.
 
+
 \membersection{wxPrintDialogData::GetPrintData}\label{wxprintdialogdatagetprintdata}
 
 \func{wxPrintData\&}{GetPrintData}{\void}
 
 Returns a reference to the internal wxPrintData object.
 
+
 \membersection{wxPrintDialogData::GetPrintToFile}\label{wxprintdialogdatagetprinttofile}
 
 \constfunc{bool}{GetPrintToFile}{\void}
 
-Returns TRUE if the user has selected printing to a file.
+Returns true if the user has selected printing to a file.
+
+
+\membersection{wxPrintDialogData::GetSelection}\label{wxprintdialogdatagetselection}
+
+\constfunc{bool}{GetSelection}{\void}
+
+Returns true if the user requested that the selection be printed (where 'selection' is
+a concept specific to the application).
+
 
 \membersection{wxPrintDialogData::GetToPage}\label{wxprintdialogdatagettopage}
 
@@ -463,11 +578,22 @@ Returns TRUE if the user has selected printing to a file.
 
 Returns the {\it to} page number, as entered by the user.
 
+
+\membersection{wxPrintDialogData::IsOk}\label{wxprintdialogdataisok}
+
+\constfunc{bool}{IsOk}{\void}
+
+Returns true if the print data is valid for using in print dialogs.
+This can return false on Windows if the current printer is not set, for example.
+On all other platforms, it returns true.
+
+
 \membersection{wxPrintDialogData::SetCollate}\label{wxprintdialogdatasetcollate}
 
 \func{void}{SetCollate}{\param{bool }{flag}}
 
-Sets the 'Collate' checkbox to TRUE or FALSE.
+Sets the 'Collate' checkbox to true or false.
+
 
 \membersection{wxPrintDialogData::SetFromPage}\label{wxprintdialogdatasetfrompage}
 
@@ -475,45 +601,58 @@ Sets the 'Collate' checkbox to TRUE or FALSE.
 
 Sets the {\it from} page number.
 
+
 \membersection{wxPrintDialogData::SetMaxPage}\label{wxprintdialogdatasetmaxpage}
 
 \func{void}{SetMaxPage}{\param{int }{page}}
 
 Sets the {\it maximum} page number.
 
+
 \membersection{wxPrintDialogData::SetMinPage}\label{wxprintdialogdatasetminpage}
 
 \func{void}{SetMinPage}{\param{int }{page}}
 
 Sets the {\it minimum} page number.
 
+
 \membersection{wxPrintDialogData::SetNoCopies}\label{wxprintdialogdatasetnocopies}
 
 \func{void}{SetNoCopies}{\param{int }{n}}
 
 Sets the default number of copies the user has requested to be printed out.
 
+
 \membersection{wxPrintDialogData::SetPrintData}\label{wxprintdialogdatasetprintdata}
 
 \func{void}{SetPrintData}{\param{const wxPrintData\& }{printData}}
 
 Sets the internal wxPrintData.
 
+
 \membersection{wxPrintDialogData::SetPrintToFile}\label{wxprintdialogdatasetprinttofile}
 
 \func{void}{SetPrintToFile}{\param{bool }{flag}}
 
-Sets the 'Print to file' checkbox to TRUE or FALSE.
+Sets the 'Print to file' checkbox to true or false.
+
+
+\membersection{wxPrintDialogData::SetSelection}\label{wxprintdialogdatasetselection}
+
+\func{void}{SetSelection}{\param{bool}{ flag}}
+
+Selects the 'Selection' radio button. The effect of printing the selection depends on how the application
+implements this command, if at all.
+
 
 \membersection{wxPrintDialogData::SetSetupDialog}\label{wxprintdialogdatasetsetupdialog}
 
 \func{void}{SetSetupDialog}{\param{bool }{flag}}
 
 Determines whether the dialog to be shown will be the Print dialog
-(pass FALSE) or Print Setup dialog (pass TRUE).
+(pass false) or Print Setup dialog (pass true).
 
-Note that the setup dialog is (according to Microsoft) obsolete from
-Windows 95, though retained for backward compatibility.
+This function has been deprecated since version 2.5.4.
 
 \membersection{wxPrintDialogData::SetToPage}\label{wxprintdialogdatasettopage}
 
@@ -521,6 +660,7 @@ Windows 95, though retained for backward compatibility.
 
 Sets the {\it to} page number.
 
+
 \membersection{wxPrintDialogData::operator $=$}\label{wxprintdialogdataassign}
 
 \func{void}{operator $=$}{\param{const wxPrintData\&}{ data}}
@@ -549,12 +689,16 @@ method of printing.
 
 \wxheading{See also}
 
-\helpref{Printing framework overview}{printingoverview}, \helpref{wxPrinterDC}{wxprinterdc}, \helpref{wxPrintDialog}{wxprintdialog},\rtfsp
-\helpref{wxPrintout}{wxprintout}, \helpref{wxPrintPreview}{wxprintpreview}.
+\helpref{Printing framework overview}{printingoverview}, 
+\helpref{wxPrinterDC}{wxprinterdc}, 
+\helpref{wxPrintDialog}{wxprintdialog}, 
+\helpref{wxPrintout}{wxprintout}, 
+\helpref{wxPrintPreview}{wxprintpreview}.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrinter::wxPrinter}
+
+\membersection{wxPrinter::wxPrinter}\label{wxprinterctor}
 
 \func{}{wxPrinter}{\param{wxPrintDialogData* }{data = NULL}}
 
@@ -563,26 +707,44 @@ dialog data, which will be copied to the printer object's local data.
 
 \wxheading{See also}
 
-\helpref{wxPrintDialogData}{wxprintdialogdata}, 
+\helpref{wxPrintDialogData}{wxprintdialogdata},
 \helpref{wxPrintData}{wxprintdata}
 
-\membersection{wxPrinter::\destruct{wxPrinter}}
 
-\func{}{\destruct{wxPrinter}}{\void}
 
-Destructor.
+\membersection{wxPrinter::CreateAbortWindow}\label{wxprintercreateabortwindow}
 
-\membersection{wxPrinter::Abort}\label{wxprinterabort}
+\func{void}{CreateAbortWindow}{\param{wxWindow* }{parent}, \param{wxPrintout* }{printout}}
 
-\func{bool}{Abort}{\void}
+Creates the default printing abort window, with a cancel button.
 
-Returns TRUE if the user has aborted the print job.
 
-\membersection{wxPrinter::CreateAbortWindow}\label{wxprintercreateabortwindow}
+\membersection{wxPrinter::GetAbort}\label{wxprintergetabort}
+
+\func{bool}{GetAbort}{\void}
+
+Returns true if the user has aborted the print job.
+
+
+\membersection{wxPrinter::GetLastError}\label{wxprintergetlasterror}
+
+\func{static wxPrinterError}{GetLastError}{\void}
+
+Return last error. Valid after calling \helpref{Print}{wxprinterprint},
+\helpref{PrintDialog}{wxprinterprintdialog} or 
+\helpref{wxPrintPreview::Print}{wxprintpreviewprint}. These functions 
+set last error to {\bf wxPRINTER\_NO\_ERROR} if no error happened.
+
+Returned value is one of the following:
+
+\twocolwidtha{7cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf wxPRINTER\_NO\_ERROR}}{No error happened.}
+\twocolitem{{\bf wxPRINTER\_CANCELLED}}{The user cancelled printing.}
+\twocolitem{{\bf wxPRINTER\_ERROR}}{There was an error during printing.}
+\end{twocollist}
 
-\func{void}{CreateAbortWindow}{\param{wxWindow* }{parent}, \param{wxPrintout* }{printout}}
 
-Creates the default printing abort window, with a cancel button.
 
 \membersection{wxPrinter::GetPrintDialogData}\label{wxprintergetprintdialogdata}
 
@@ -590,15 +752,19 @@ Creates the default printing abort window, with a cancel button.
 
 Returns the \helpref{print data}{wxprintdata} associated with the printer object.
 
+
 \membersection{wxPrinter::Print}\label{wxprinterprint}
 
-\func{bool}{Print}{\param{wxWindow *}{parent}, \param{wxPrintout *}{printout}, \param{bool }{prompt=TRUE}}
+\func{bool}{Print}{\param{wxWindow *}{parent}, \param{wxPrintout *}{printout}, \param{bool }{prompt=true}}
 
 Starts the printing process. Provide a parent window, a user-defined wxPrintout object which controls
 the printing of a document, and whether the print dialog should be invoked first.
 
-Print could return FALSE if there was a problem initializing the printer device context
-(current printer not set, for example).
+Print could return false if there was a problem initializing the printer device context
+(current printer not set, for example) or the user cancelled printing. Call
+\helpref{wxPrinter::GetLastError}{wxprintergetlasterror} to get detailed
+information about the kind of the error.
+
 
 \membersection{wxPrinter::PrintDialog}\label{wxprinterprintdialog}
 
@@ -606,16 +772,20 @@ Print could return FALSE if there was a problem initializing the printer device
 
 Invokes the print dialog. If successful (the user did not press Cancel
 and no error occurred), a suitable device context will be returned
-(otherwise NULL is returned).
+(otherwise NULL is returned -- call
+\helpref{wxPrinter::GetLastError}{wxprintergetlasterror} to get detailed
+information about the kind of the error).
 
 The application must delete this device context to avoid a memory leak.
 
+
 \membersection{wxPrinter::ReportError}\label{wxprinterreporterror}
 
 \func{void}{ReportError}{\param{wxWindow *}{parent}, \param{wxPrintout *}{printout}, \param{const wxString\& }{message}}
 
 Default error-reporting function.
 
+
 \membersection{wxPrinter::Setup}\label{wxprintersetup}
 
 \func{bool}{Setup}{\param{wxWindow *}{parent}}
@@ -625,10 +795,10 @@ Windows 95, though retained for backward compatibility.
 
 \section{\class{wxPrinterDC}}\label{wxprinterdc}
 
-A printer device context is specific to Windows, and allows access to
-any printer with a Windows driver. See \helpref{wxDC}{wxdc} for further information
-on device contexts, and \helpref{wxDC::GetSize}{wxdcgetsize} for advice on
-achieving the correct scaling for the page.
+A printer device context is specific to MSW and Mac, and allows access to any
+printer with a Windows or Macintosh driver. See \helpref{wxDC}{wxdc} for further
+information on device contexts, and \helpref{wxDC::GetSize}{wxdcgetsize} for
+advice on achieving the correct scaling for the page.
 
 \wxheading{Derived from}
 
@@ -639,38 +809,77 @@ achieving the correct scaling for the page.
 
 <wx/dcprint.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
-\helpref{wxDC}{wxdc}, \helpref{Printing framework overview}{printingoverview}
+\helpref{Printing framework overview}{printingoverview}, 
+\helpref{wxDC}{wxdc}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrinterDC::wxPrinterDC}
+
+\membersection{wxPrinterDC::wxPrinterDC}\label{wxprinterdcctor}
 
 \func{}{wxPrinterDC}{\param{const wxPrintData\& }{printData}}
 
-Pass a \helpref{wxPrintData}{wxprintdata} object with information
+Constructor. Pass a \helpref{wxPrintData}{wxprintdata} object with information
 necessary for setting up a suitable printer device context. This
-is the recommended way to construct a wxPrinterDC.
+is the recommended way to construct a wxPrinterDC.  Make sure you 
+specify a reference to a \helpref{wxPrintData}{wxprintdata} object,
+not a pointer - you may not even get a warning if you pass a pointer
+instead.
 
 \func{}{wxPrinterDC}{\param{const wxString\& }{driver}, \param{const wxString\& }{device}, \param{const wxString\& }{output},
- \param{const bool }{interactive = TRUE}, \param{int }{orientation = wxPORTRAIT}}
+ \param{const bool }{interactive = true}, \param{int }{orientation = wxPORTRAIT}}
 
 Constructor. With empty strings for the first three arguments, the default printer dialog is
 displayed. {\it device} indicates the type of printer and {\it output}
 is an optional file for printing to. The {\it driver} parameter is
 currently unused.  Use the {\it Ok} member to test whether the
-constructor was successful in creating a useable device context.
+constructor was successful in creating a usable device context.
 
 This constructor is deprecated and retained only for backward compatibility.
 
+\membersection{wxPrinterDC::GetPaperRect}\label{wxprinterdcgetpaperrect}
+
+\func{wxRect}{wxPrinterDC::GetPaperRect}{}
+
+Return the rectangle in device coordinates that corresponds to the full paper
+area, including the nonprinting regions of the paper. The point (0,0) in device
+coordinates is the top left corner of the page rectangle, which is the printable
+area on MSW and Mac. The coordinates of the top left corner of the paper
+rectangle will therefore have small negative values, while the bottom right
+coordinates will be somewhat larger than the values returned by
+\helpref{wxDC::GetSize}{wxdcgetsize}.
+
+
 \section{\class{wxPrintout}}\label{wxprintout}
 
-This class encapsulates the functionality of printing out an
-application document. A new class must be derived and members
-overridden to respond to calls such as OnPrintPage and HasPage.
-Instances of this class are passed to wxPrinter::Print or a
-wxPrintPreview object to initiate printing or previewing.
+This class encapsulates the functionality of printing out an application
+document. A new class must be derived and members overridden to respond to calls
+such as OnPrintPage and HasPage and to render the print image onto an associated
+\helpref{wxDC}{wxdc}. Instances of this class are passed to wxPrinter::Print or
+to a wxPrintPreview object to initiate printing or previewing.
+
+Your derived wxPrintout is responsible for drawing both the preview image and
+the printed page. If your windows' drawing routines accept an arbitrary DC as an
+argument, you can re-use those routines within your wxPrintout subclass to draw
+the printout image. You may also add additional drawing elements within your
+wxPrintout subclass, like headers, footers, and/or page numbers. However, the
+image on the printed page will often differ from the image drawn on the screen,
+as will the print preview image -- not just in the presence of headers and
+footers, but typically in scale. A high-resolution printer presents a much
+larger drawing surface (i.e., a higher-resolution DC); a zoomed-out preview
+image presents a much smaller drawing surface (lower-resolution DC). By using
+the routines FitThisSizeToXXX() and/or MapScreenSizeToXXX() within your
+wxPrintout subclass to set the user scale and origin of the associated DC, you
+can easily use a single drawing routine to draw on your application's windows,
+to create the print preview image, and to create the printed paper image, and
+achieve a common appearance to the preview image and the printed page.
+
 
 \wxheading{Derived from}
 
@@ -682,100 +891,310 @@ wxPrintPreview object to initiate printing or previewing.
 
 \wxheading{See also}
 
-\helpref{Printing framework overview}{printingoverview}, \helpref{wxPrinterDC}{wxprinterdc}, \helpref{wxPrintDialog}{wxprintdialog},\rtfsp
-\helpref{wxPrinter}{wxprinter}, \helpref{wxPrintPreview}{wxprintpreview}
+\helpref{Printing framework overview}{printingoverview}, 
+\helpref{wxPrinterDC}{wxprinterdc}, 
+\helpref{wxPrintDialog}{wxprintdialog}, 
+\helpref{wxPageSetupDialog}{wxpagesetupdialog}, 
+\helpref{wxPrinter}{wxprinter}, 
+\helpref{wxPrintPreview}{wxprintpreview}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrintout::wxPrintout}
+
+\membersection{wxPrintout::wxPrintout}\label{wxprintoutctor}
 
 \func{}{wxPrintout}{\param{const wxString\& }{title = "Printout"}}
 
-Constructor. Pass an optional title argument (currently unused).
+Constructor. Pass an optional title argument - the current filename would be a good idea. This will appear in the printing list
+(at least in MSW)
+
 
-\membersection{wxPrintout::\destruct{wxPrintout}}
+\membersection{wxPrintout::\destruct{wxPrintout}}\label{wxprintoutdtor}
 
 \func{}{\destruct{wxPrintout}}{\void}
 
 Destructor.
 
+
 \membersection{wxPrintout::GetDC}\label{wxprintoutgetdc}
 
 \func{wxDC *}{GetDC}{\void}
 
 Returns the device context associated with the printout (given to the printout at start of
-printing or previewing). This will be a wxPrinterDC if printing under Windows,
+printing or previewing). This will be a wxPrinterDC if printing under Windows or Mac,
 a wxPostScriptDC if printing on other platforms, and a wxMemoryDC if previewing.
 
+
 \membersection{wxPrintout::GetPageInfo}\label{wxprintoutgetpageinfo}
 
 \func{void}{GetPageInfo}{\param{int *}{minPage}, \param{int *}{maxPage}, \param{int *}{pageFrom}, \param{int *}{pageTo}}
 
-Called by the framework to obtain information from the application about minimum and maximum page values that
-the user can select, and the required page range to be printed. By default this
-returns 1, 32000 for the page minimum and maximum values, and 1, 1 for the required page range.
+Called by the framework to obtain information from the application about minimum
+and maximum page values that the user can select, and the required page range to
+be printed. By default this returns 1, 32000 for the page minimum and maximum
+values, and 1, 1 for the required page range.
 
 If {\it minPage} is zero, the page number controls in the print dialog will be disabled.
 
+\pythonnote{When this method is implemented in a derived Python class,
+it should be designed to take no parameters (other than the self
+reference) and to return a tuple of four integers.
+}
+
+\perlnote{When this method is overridden in a derived class,
+it must not take any parameters, and returns a 4-element list.
+}
+
+
 \membersection{wxPrintout::GetPageSizeMM}\label{wxprintoutgetpagesizemm}
 
 \func{void}{GetPageSizeMM}{\param{int *}{w}, \param{int *}{h}}
 
 Returns the size of the printer page in millimetres.
 
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
+
 \membersection{wxPrintout::GetPageSizePixels}\label{wxprintoutgetpagesizepixels}
 
 \func{void}{GetPageSizePixels}{\param{int *}{w}, \param{int *}{h}}
 
-Returns the size of the printer page in pixels. These may not be the
-same as the values returned from \helpref{wxDC::GetSize}{wxdcgetsize} if
-the printout is being used for previewing, since in this case, a
-memory device context is used, using a bitmap size reflecting the current
-preview zoom. The application must take this discrepancy into account if
-previewing is to be supported.
+Returns the size of the printer page in pixels, called the \em{page rectangle}.
+The page rectangle has a top left corner at (0,0) and a bottom right corner at
+(w,h). These values may not be the same as the values returned from
+\helpref{wxDC::GetSize}{wxdcgetsize}; if the printout is being used for
+previewing, a memory device context is used, which uses a bitmap size reflecting
+the current preview zoom. The application must take this discrepancy into
+account if previewing is to be supported.
+
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
+
+\membersection{wxPrintout::GetPaperRectPixels}\label{wxprintoutgetpaperrectpixels}
+
+\func{wxRect}{GetPaperRectPixels}{}
+
+Returns the rectangle that corresponds to the entire paper in pixels, called the
+\em{paper rectangle}. This distinction between paper rectangle and page
+rectangle reflects the fact that most printers cannot print all the way to the
+edge of the paper. The page rectangle is a rectangle whose top left corner is at
+(0,0) and whose width and height are given by
+\helpref{wxDC::GetPageSizePixels}{wxprintoutgetpagesizepixels}. On MSW and Mac,
+the page rectangle gives the printable area of the paper, while the paper
+rectangle represents the entire paper, including non-printable borders. Thus,
+the rectangle returned by GetPaperRectPixels will have a top left corner whose
+coordinates are small negative numbers and the bottom right corner will have
+values somewhat larger than the width and height given by
+\helpref{wxDC::GetPageSizePixels}{wxprintoutgetpagesizepixels}. On other
+platforms and for PostScript printing, the paper is treated as if its entire
+area were printable, so this function will return the same rectangle as the page
+rectangle.
+
 
 \membersection{wxPrintout::GetPPIPrinter}\label{wxprintoutgetppiprinter}
 
 \func{void}{GetPPIPrinter}{\param{int *}{w}, \param{int *}{h}}
 
 Returns the number of pixels per logical inch of the printer device context.
-Dividing the printer PPI by the screen PPI can give a suitable scaling
-factor for drawing text onto the printer. Remember to multiply
-this by a scaling factor to take the preview DC size into account.
+Dividing the printer PPI by the screen PPI can give a suitable scaling factor
+for drawing text onto the printer. Remember to multiply this by a scaling factor
+to take the preview DC size into account. Or you can just use the
+FitThisSizeToXXX() and MapScreenSizeToXXX routines below, which do most of the
+scaling calculations for you.
+
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 
 \membersection{wxPrintout::GetPPIScreen}\label{wxprintoutgetppiscreen}
 
 \func{void}{GetPPIScreen}{\param{int *}{w}, \param{int *}{h}}
 
 Returns the number of pixels per logical inch of the screen device context.
-Dividing the printer PPI by the screen PPI can give a suitable scaling
-factor for drawing text onto the printer. Remember to multiply
-this by a scaling factor to take the preview DC size into account.
+Dividing the printer PPI by the screen PPI can give a suitable scaling factor
+for drawing text onto the printer. If you are doing your own scaling, remember
+to multiply this by a scaling factor to take the preview DC size into account.
+
+
+\membersection{wxPrintout::GetTitle}\label{wxprintoutgettitle}
+
+\func{wxString}{GetTitle}{\void}
+
+Returns the title of the printout
+
+\pythonnote{This method returns the output-only parameters as a tuple.}
+
+\perlnote{In wxPerl this method takes no arguments and returns a
+2-element list {\tt ( w, h )}}
+
 
 \membersection{wxPrintout::HasPage}\label{wxprintouthaspage}
 
 \func{bool}{HasPage}{\param{int}{ pageNum}}
 
-Should be overriden to return TRUE if the document has this page, or FALSE
-if not. Returning FALSE signifies the end of the document. By default,
+Should be overridden to return true if the document has this page, or false
+if not. Returning false signifies the end of the document. By default,
 HasPage behaves as if the document has only one page.
 
+
 \membersection{wxPrintout::IsPreview}\label{wxprintoutispreview}
 
 \func{bool}{IsPreview}{\void}
 
-Returns TRUE if the printout is currently being used for previewing.
+Returns true if the printout is currently being used for previewing.
+
+
+\membersection{wxPrintout::FitThisSizeToPaper}\label{wxprintoutfitthissizetopaper}
+
+\func{void}{FitThisSizeToPaper}{\param{const wxSize\& }{imageSize}}
+
+Set the user scale and device origin of the wxDC associated with this wxPrintout
+so that the given image size fits entirely within the paper and the origin is at
+the top left corner of the paper. Note that with most printers, the region
+around the edges of the paper are not printable so that the edges of the image
+could be cut off. Use this if you're managing your own page margins.
+
+\membersection{wxPrintout::FitThisSizeToPage}\label{wxprintoutfitthissizetopage}
+
+
+\func{void}{FitThisSizeToPage}{\param{const wxSize\& }{imageSize}}
+
+Set the user scale and device origin of the wxDC associated with this wxPrintout
+so that the given image size fits entirely within the page rectangle and the
+origin is at the top left corner of the page rectangle. On MSW and Mac, the page
+rectangle is the printable area of the page. On other platforms and PostScript
+printing, the page rectangle is the entire paper. Use this if you want your
+printed image as large as possible, but with the caveat that on some platforms, 
+portions of the image might be cut off at the edges.
+
+
+\membersection{wxPrintout::FitThisSizeToPageMargins}\label{wxprintoutfitthissizetopagemargins}
+
+\func{void}{FitThisSizeToPageMargins}{\param{const wxSize\& }{imageSize}, \param{const wxPageSetupDialogData\& }{pageSetupData}}
+
+Set the user scale and device origin of the wxDC associated with this wxPrintout
+so that the given image size fits entirely within the page margins set in the
+given wxPageSetupDialogData object. This function provides the greatest
+consistency across all platforms because it does not depend on having access to
+the printable area of the paper. Note that on Mac, the native wxPageSetupDialog
+does not let you set the page margins; you'll have to provide your own mechanism,
+or you can use the Mac-only class wxMacPageMarginsDialog.
+
+
+\membersection{wxPrintout::MapScreenSizeToPaper}\label{wxprintoutmapscreensizetopaper}
+
+\func{void}{MapScreenSizeToPaper}{}
+
+Set the user scale and device origin of the wxDC associated with this wxPrintout
+so that the printed page matches the screen size as closely as possible
+and the logical origin is in the top left corner of the paper rectangle.
+That is,
+a 100-pixel object on screen should appear at the same size on the printed page. (It
+will, of course, be larger or smaller in the preview image, depending on the zoom
+factor.) Use this if you want WYSIWYG behavior, e.g., in a text editor.
+
+
+\membersection{wxPrintout::MapScreenSizeToPage}\label{wxprintoutmapscreensizetopage}
+
+\func{void}{MapScreenSizeToPage}{}
+
+This sets the user scale of the wxDC assocated with this wxPrintout to the same
+scale as \helpref{MapScreenSizeToPaper}{wxprintoutmapscreensizetopaper} but sets
+the logical origin to the top left corner of the page rectangle.
+
+
+\membersection{wxPrintout::MapScreenSizeToPageMargins}\label{wxprintoutmapscreensizetopagemargins}
+
+\func{void}{MapScreenSizeToPageMargins}{\param{const wxPageSetupDialogData\& }{pageSetupData}}
+
+This sets the user scale of the wxDC assocated with this wxPrintout to the same
+scale as
+\helpref{MapScreenSizeToPageMargins}{wxprintoutmapscreensizetopagemargins} but
+sets the logical origin to the top left corner of the page margins specified by
+the given wxPageSetupDialogData object.
+
+
+\membersection{wxPrintout::MapScreenSizeToDevice}\label{wxprintoutmapscreensizetodevice}
+
+\func{void}{MapScreenSizeToDevice}{}
+
+Set the user scale and device origin of the wxDC associated with this wxPrintout
+so that one screen pixel maps to one device pixel on the DC. That is, the user
+scale is set to (1,1) and the device origin is set to (0,0). Use this if you
+want to do your own scaling prior to calling wxDC drawing calls, for example, if
+your underlying model is floating-point and you want to achieve maximum drawing
+precision on high-resolution printers. (Note that while the underlying drawing
+model of Mac OS X is floating-point, wxWidgets's drawing model scales from integer
+coordinates.) You can use the GetLogicalXXXRect() routines below to obtain the
+paper rectangle, page rectangle, or page margins rectangle to perform your own scaling.
+
+
+\membersection{wxPrintout::GetLogicalPaperRect}\label{wxprintoutgetlogicalpaperrect}
+
+\func{wxRect}{GetLogicalPaperRect}{}
+
+Return the rectangle corresponding to the paper in the associated wxDC's
+logical coordinates for the current user scale and device origin.
+
+
+\membersection{wxPrintout::GetLogicalPageRect}\label{wxprintoutgetlogicalpagerect}
+
+\func{wxRect}{GetLogicalPageRect}{}
+
+Return the rectangle corresponding to the page in the associated wxDC's
+logical coordinates for the current user scale and device origin. 
+On MSW and Mac, this will be the printable area of the paper. On other platforms
+and PostScript printing, this will be the full paper rectangle.
+
+
+\membersection{wxPrintout::GetLogicalPageMarginsRect}\label{wxprintoutgetlogicalpagemarginsrect}
+
+\func{wxRect}{GetLogicalPageMarginsRect}{\param{const wxPageSetupDialogData\& }{pageSetupData}}
+
+Return the rectangle corresponding to the page margins specified by the given
+wxPageSetupDialogData object in the associated wxDC's logical coordinates for the
+current user scale and device origin. The page margins are specified
+with respect to the edges of the paper on all platforms.
+
+
+\membersection{wxPrintout::SetLogicalOrigin}\label{wxprintoutsetlogicalorigin}
+
+\func{void}{SetLogicalOrigin}{\param{wxCoord }{x}, \param{wxCoord }{y}}
+
+Set the device origin of the associated wxDC so that the current logical point
+becomes the new logical origin.
+
+
+\membersection{wxPrintout::OffsetLogicalOrigin}\label{wxprintoutoffsetlogicalorigin}
+
+\func{void}{OffsetLogicalOrigin}{\param{wxCoord }{xoff}, \param{wxCoord }{yoff}}
+
+Shift the device origin by an amount specified in logical coordinates.
+
 
 \membersection{wxPrintout::OnBeginDocument}\label{wxprintoutonbegindocument}
 
 \func{bool}{OnBeginDocument}{\param{int}{ startPage}, \param{int}{ endPage}}
 
-Called by the framework at the start of document printing. Return FALSE from
+Called by the framework at the start of document printing. Return false from
 this function cancels the print job. OnBeginDocument is called once for every
 copy printed.
 
 The base wxPrintout::OnBeginDocument {\it must} be called (and the return value
-checked) from within the overriden function, since it calls wxDC::StartDoc.
+checked) from within the overridden function, since it calls wxDC::StartDoc.
+
+\pythonnote{If this method is overridden in a Python class then the
+base class version can be called by using the method
+{\tt base\_OnBeginDocument(startPage, endPage)}. }
+
 
 \membersection{wxPrintout::OnEndDocument}\label{wxprintoutonenddocument}
 
@@ -785,7 +1204,8 @@ Called by the framework at the end of document printing. OnEndDocument
 is called once for every copy printed.
 
 The base wxPrintout::OnEndDocument {\it must} be called
-from within the overriden function, since it calls wxDC::EndDoc.
+from within the overridden function, since it calls wxDC::EndDoc.
+
 
 \membersection{wxPrintout::OnBeginPrinting}\label{wxprintoutonbeginprinting}
 
@@ -794,6 +1214,7 @@ from within the overriden function, since it calls wxDC::EndDoc.
 Called by the framework at the start of printing. OnBeginPrinting is called once for every
 print job (regardless of how many copies are being printed).
 
+
 \membersection{wxPrintout::OnEndPrinting}\label{wxprintoutonendprinting}
 
 \func{void}{OnEndPrinting}{\void}
@@ -801,6 +1222,7 @@ print job (regardless of how many copies are being printed).
 Called by the framework at the end of printing. OnEndPrinting
 is called once for every print job (regardless of how many copies are being printed).
 
+
 \membersection{wxPrintout::OnPreparePrinting}\label{wxprintoutonprepareprinting}
 
 \func{void}{OnPreparePrinting}{\void}
@@ -809,18 +1231,17 @@ Called once by the framework before any other demands are made of the
 wxPrintout object. This gives the object an opportunity to calculate the
 number of pages in the document, for example.
 
+
 \membersection{wxPrintout::OnPrintPage}\label{wxprintoutonprintpage}
 
 \func{bool}{OnPrintPage}{\param{int}{ pageNum}}
 
-Called by the framework when a page should be printed. Returning FALSE cancels
+Called by the framework when a page should be printed. Returning false cancels
 the print job. The application can use wxPrintout::GetDC to obtain a device
 context to draw on.
 
 \section{\class{wxPrintPreview}}\label{wxprintpreview}
 
-\overview{Printing framework overview}{printingoverview}
-
 Objects of this class manage the print preview process. The object is passed
 a wxPrintout object, and the wxPrintPreview object itself is passed to
 a wxPreviewFrame object. Previewing is started by initializing and showing
@@ -837,14 +1258,19 @@ immediately after the frame is shown.
 
 \wxheading{See also}
 
-\overview{Printing framework overview}{printingoverview}, \helpref{wxPrinterDC}{wxprinterdc}, \helpref{wxPrintDialog}{wxprintdialog},\rtfsp
-\helpref{wxPrintout}{wxprintout}, \helpref{wxPrinter}{wxprinter},\rtfsp
-\helpref{wxPreviewCanvas}{wxpreviewcanvas}, \helpref{wxPreviewControlBar}{wxpreviewcontrolbar},\rtfsp
+\overview{Printing framework overview}{printingoverview}, 
+\helpref{wxPrinterDC}{wxprinterdc}, 
+\helpref{wxPrintDialog}{wxprintdialog}, 
+\helpref{wxPrintout}{wxprintout}, 
+\helpref{wxPrinter}{wxprinter}, 
+\helpref{wxPreviewCanvas}{wxpreviewcanvas}, 
+\helpref{wxPreviewControlBar}{wxpreviewcontrolbar}, 
 \helpref{wxPreviewFrame}{wxpreviewframe}.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxPrintPreview::wxPrintPreview}
+
+\membersection{wxPrintPreview::wxPrintPreview}\label{wxprintpreviewctor}
 
 \func{}{wxPrintPreview}{\param{wxPrintout* }{printout}, \param{wxPrintout* }{printoutForPrinting},
 \param{wxPrintData* }{data=NULL}}
@@ -862,35 +1288,32 @@ called, since they will be deleted in the wxPrintPreview constructor.
 The same does not apply to the {\it data} argument.
 
 Test the Ok member to check whether the wxPrintPreview object was created correctly.
-Ok could return FALSE if there was a problem initializing the printer device context
+Ok could return false if there was a problem initializing the printer device context
 (current printer not set, for example).
 
-\membersection{wxPrintPreview::\destruct{wxPrintPreview}}
+
+\membersection{wxPrintPreview::\destruct{wxPrintPreview}}\label{wxprintpreviewdtor}
 
 \func{}{\destruct{wxPrinter}}{\void}
 
 Destructor. Deletes both print preview objects, so do not destroy these objects
 in your application.
 
-\membersection{wxPrintPreview::DrawBlankPage}\label{wxprintpreviewdrawblankpage}
-
-\func{bool}{DrawBlankPage}{\param{wxWindow* }{window}}
-
-Draws a representation of the blank page into the preview window. Used
-internally.
 
 \membersection{wxPrintPreview::GetCanvas}\label{wxprintpreviewgetcanvas}
 
-\func{wxWindow* }{GetCanvas}{\void}
+\func{wxPreviewCanvas* }{GetCanvas}{\void}
 
 Gets the preview window used for displaying the print preview image.
 
+
 \membersection{wxPrintPreview::GetCurrentPage}\label{wxprintpreviewgetcurrentpage}
 
 \func{int}{GetCurrentPage}{\void}
 
 Gets the page currently being previewed.
 
+
 \membersection{wxPrintPreview::GetFrame}\label{wxprintpreviewgetframe}
 
 \func{wxFrame *}{GetFrame}{\void}
@@ -898,23 +1321,20 @@ Gets the page currently being previewed.
 Gets the frame used for displaying the print preview canvas
 and control bar.
 
+
 \membersection{wxPrintPreview::GetMaxPage}\label{wxprintpreviewgetmaxpage}
 
 \func{int}{GetMaxPage}{\void}
 
 Returns the maximum page number.
 
+
 \membersection{wxPrintPreview::GetMinPage}\label{wxprintpreviewgetminpage}
 
 \func{int}{GetMinPage}{\void}
 
 Returns the minimum page number.
 
-\membersection{wxPrintPreview::GetPrintData}\label{wxprintpreviewgetprintdata}
-
-\func{wxPrintData\&}{GetPrintData}{\void}
-
-Returns a reference to the internal print data.
 
 \membersection{wxPrintPreview::GetPrintout}\label{wxprintpreviewgetprintout}
 
@@ -922,6 +1342,7 @@ Returns a reference to the internal print data.
 
 Gets the preview printout object associated with the wxPrintPreview object.
 
+
 \membersection{wxPrintPreview::GetPrintoutForPrinting}\label{wxprintpreviewgetprintoutforprinting}
 
 \func{wxPrintout *}{GetPrintoutForPrinting}{\void}
@@ -929,16 +1350,18 @@ Gets the preview printout object associated with the wxPrintPreview object.
 Gets the printout object to be used for printing from within the preview interface,
 or NULL if none exists.
 
-\membersection{wxPrintPreview::Ok}\label{wxprintpreviewok}
+
+\membersection{wxPrintPreview::IsOk}\label{wxprintpreviewisok}
 
 \func{bool}{Ok}{\void}
 
-Returns TRUE if the wxPrintPreview is valid, FALSE otherwise. It could return FALSE if there was a
+Returns true if the wxPrintPreview is valid, false otherwise. It could return false if there was a
 problem initializing the printer device context (current printer not set, for example).
 
+
 \membersection{wxPrintPreview::PaintPage}\label{wxprintpreviewpaintpage}
 
-\func{bool}{PaintPage}{\param{wxWindow* }{window}}
+\func{bool}{PaintPage}{\param{wxPreviewCanvas *}{canvas}, \param{wxDC& }{dc}}
 
 This refreshes the preview window with the preview image.
 It must be called from the preview window's OnPaint member.
@@ -946,6 +1369,7 @@ It must be called from the preview window's OnPaint member.
 The implementation simply blits the preview bitmap onto
 the canvas, creating a new preview bitmap if none exists.
 
+
 \membersection{wxPrintPreview::Print}\label{wxprintpreviewprint}
 
 \func{bool}{Print}{\param{bool }{prompt}}
@@ -955,24 +1379,32 @@ supplied in the wxPrintPreview constructor.
 Will normally be called by the {\bf Print...} panel item on the
 preview frame's control bar.
 
+Returns false in case of error -- call
+\helpref{wxPrinter::GetLastError}{wxprintergetlasterror} to get detailed
+information about the kind of the error.
+
+
 \membersection{wxPrintPreview::RenderPage}\label{wxprintpreviewrenderpage}
 
 \func{bool}{RenderPage}{\param{int }{pageNum}}
 
 Renders a page into a wxMemoryDC. Used internally by wxPrintPreview.
 
+
 \membersection{wxPrintPreview::SetCanvas}\label{wxprintpreviewsetcanvas}
 
-\func{void}{SetCanvas}{\param{wxWindow* }{window}}
+\func{void}{SetCanvas}{\param{wxPreviewCanvas* }{window}}
 
 Sets the window to be used for displaying the print preview image.
 
+
 \membersection{wxPrintPreview::SetCurrentPage}\label{wxprintpreviewsetcurrentpage}
 
 \func{void}{SetCurrentPage}{\param{int}{ pageNum}}
 
 Sets the current page to be previewed.
 
+
 \membersection{wxPrintPreview::SetFrame}\label{wxprintpreviewsetframe}
 
 \func{void}{SetFrame}{\param{wxFrame *}{frame}}
@@ -980,12 +1412,14 @@ Sets the current page to be previewed.
 Sets the frame to be used for displaying the print preview canvas
 and control bar.
 
+
 \membersection{wxPrintPreview::SetPrintout}\label{wxprintpreviewsetprintout}
 
 \func{void}{SetPrintout}{\param{wxPrintout *}{printout}}
 
 Associates a printout object with the wxPrintPreview object.
 
+
 \membersection{wxPrintPreview::SetZoom}\label{wxprintpreviewsetzoom}
 
 \func{void}{SetZoom}{\param{int}{ percent}}
