X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7bcb11d30764df47144189e164f53d8171ed4a63..3072610753c6e2c43808931e0a9ab9cc740bda8f:/docs/latex/wx/postscpt.tex

diff --git a/docs/latex/wx/postscpt.tex b/docs/latex/wx/postscpt.tex
index b1bd9adda5..425d22d4e7 100644
--- a/docs/latex/wx/postscpt.tex
+++ b/docs/latex/wx/postscpt.tex
@@ -35,11 +35,5 @@ get PostScript printing settings.
 This constructor and the global printer settings are now deprecated;
 use the wxPrintData constructor instead.
 
-\membersection{wxPostScriptDC::GetStream}
-
-\func{ostream *}{GetStream}{\void}
-
-Returns the stream currently being used to write PostScript output. Use this
-to insert any PostScript code that is outside the scope of wxPostScriptDC.
 
 
