X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7b4b24bca94555afc29762acfc5b100009bb29ff..c266eff98c5e44012647f54f38a1e29ecabd8759:/docs/latex/wx/view.tex

diff --git a/docs/latex/wx/view.tex b/docs/latex/wx/view.tex
index 3dc532229a..d2f90a297c 100644
--- a/docs/latex/wx/view.tex
+++ b/docs/latex/wx/view.tex
@@ -25,6 +25,10 @@ and \helpref{wxDocManager}{wxdocmanager} classes.
 
 <wx/docview.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxView overview}{wxviewoverview}, \helpref{wxDocument}{wxdocument}, \helpref{wxDocTemplate}{wxdoctemplate},\rtfsp
@@ -141,7 +145,7 @@ frame associated with the view.
 
 \membersection{wxView::OnClosingDocument}\label{wxviewonclosingdocument}
 
-\func{virtual void}{OnClosingDoocument}{\void}
+\func{virtual void}{OnClosingDocument}{\void}
 
 Override this to clean up the view when the document is being
 closed.
@@ -209,3 +213,4 @@ between the ``Frame'' in the method name and the type of its parameter.
 \func{void}{SetViewName}{\param{const wxString\& }{name}}
 
 Sets the view type name. Should only be called by the framework.
+
