X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7b1bf3ad2d419ea08ec29a39ed4c96c33a2f12e1..daf5b37afdda9e8ab7f909e01ffd6387219a80ea:/docs/latex/wx/log.tex?ds=sidebyside

diff --git a/docs/latex/wx/log.tex b/docs/latex/wx/log.tex
index 7fb5832297..7a606ef27c 100644
--- a/docs/latex/wx/log.tex
+++ b/docs/latex/wx/log.tex
@@ -34,6 +34,10 @@ No base class
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Function groups}}}
 
 \membersection{Global functions}
@@ -429,6 +433,10 @@ delete wxLog::SetActiveTarget(...something else or NULL...);
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxLogChain::wxLogChain}\label{wxlogchainctor}
@@ -569,6 +577,10 @@ would be better written as:
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxLogNull::wxLogNull}\label{wxlognullctor}
@@ -598,12 +610,17 @@ don't want this to happen, use wxLogInterposerTemp instead.
 
 \wxheading{Derived from}
 
-\helpref{wxLogChain}{wxlogchain}
+\helpref{wxLogChain}{wxlogchain}\\
+\helpref{wxLog}{wxlog}
 
 \wxheading{Include files}
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxLogInterposer::wxLogInterposer}\label{wxloginterposerctor}
@@ -624,12 +641,17 @@ and/or \helpref{DoLogString}{wxlogdologstring} methods.
 
 \wxheading{Derived from}
 
-\helpref{wxLogChain}{wxlogchain}
+\helpref{wxLogChain}{wxlogchain}\\
+\helpref{wxLog}{wxlog}
 
 \wxheading{Include files}
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxLogInterposerTemp::wxLogInterposerTemp}\label{wxloginterposertempctor}
@@ -652,6 +674,10 @@ wxWidgets applications which send all the output to {\tt stderr}.
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxLogStream}{wxlogstream}
@@ -682,6 +708,10 @@ the standard iostream library support ({\tt wxUSE\_STD\_IOSTREAM} must be on).
 
 <wx/log.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxLogStderr}{wxlogstderr},\\
@@ -738,7 +768,9 @@ them normally by showing the standard log dialog.
 
 \wxheading{Derived from}
 
-\helpref{wxLogInterposer}{wxloginterposer}
+\helpref{wxLogInterposer}{wxloginterposer}\\
+\helpref{wxLogChain}{wxlogchain}\\
+\helpref{wxLog}{wxlog}
 
 \wxheading{Include files}
 
