X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7b0c238d4a82d0b6553b6a06f4fbc218cb94d3dd..91fa114d88972cdfe698343560f3ef5d17b4eac1:/docs/latex/wx/size.tex

diff --git a/docs/latex/wx/size.tex b/docs/latex/wx/size.tex
index 0742609895..78648cfa8b 100644
--- a/docs/latex/wx/size.tex
+++ b/docs/latex/wx/size.tex
@@ -3,7 +3,7 @@
 A {\bf wxSize} is a useful data structure for graphics operations.
 It simply contains integer {\it width} and {\it height} members.
 
-wxSize is used throughout wxWindows as well as wxPoint which, although almost
+wxSize is used throughout wxWidgets as well as wxPoint which, although almost
 equivalent to wxSize, has a different meaning: wxPoint represents a position
 while wxSize - the size.
 
@@ -54,7 +54,7 @@ corresponding dimensions of the \arg{size}.
 \constfunc{bool}{IsFullySpecified}{\void}
 
 Returns \true if neither of the size object components is equal to $-1$, which
-is used as default for the size values in wxWindows (hence the predefined 
+is used as default for the size values in wxWidgets (hence the predefined 
 \texttt{wxDefaultSize} has both of its components equal to $-1$).
 
 This method is typically used before calling 
