X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7af3ca164537ce06c7df5f9923a53a0d82e21cd0..fcf77487edae715c75f0f802a96e203d88dd56c6:/docs/latex/wx/ffile.tex

diff --git a/docs/latex/wx/ffile.tex b/docs/latex/wx/ffile.tex
index 76422f67ac..fd49d497bb 100644
--- a/docs/latex/wx/ffile.tex
+++ b/docs/latex/wx/ffile.tex
@@ -160,7 +160,7 @@ The number of bytes read.
 
 \func{bool}{Seek}{\param{long }{ofs}, \param{wxSeekMode }{mode = wxFromStart}}
 
-Seeks to the specified position and returs TRUE on success.
+Seeks to the specified position and returns TRUE on success.
 
 \wxheading{Parameters}
 
