X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7af3ca164537ce06c7df5f9923a53a0d82e21cd0..552861bf308cf2fd12f786a5443d379b55f63d81:/docs/latex/wx/tsizer.tex

diff --git a/docs/latex/wx/tsizer.tex b/docs/latex/wx/tsizer.tex
index 405d8844d3..4f60169188 100644
--- a/docs/latex/wx/tsizer.tex
+++ b/docs/latex/wx/tsizer.tex
@@ -252,11 +252,9 @@ MyDialog::MyDialog(wxFrame *parent, wxWindowID id, const wxString &title )
      0,                // make vertically unstretchable
      wxALIGN_CENTER ); // no border and centre horizontally
 
-  SetAutoLayout( TRUE );     // tell dialog to use sizer
-  SetSizer( topsizer );      // actually set the sizer
+  SetSizer( topsizer );      // use the sizer for layout
 
-  topsizer->Fit( this );            // set size to minimum size as calculated by the sizer
-  topsizer->SetSizeHints( this );   // set size hints to honour mininum size
+  topsizer->SetSizeHints( this );   // set size hints to honour minimum size
 }
 \end{verbatim}
 
@@ -286,7 +284,7 @@ sizer.
 
 In order to query the size of notebook page, this page needs to have its
 own sizer, otherwise the wxNotebookSizer will ignore it. Notebook pages
-get their size by assigning one to them using \helpref{wxWindow::SetSizer}{wxwindowsetsizer} 
+get their sizer by assigning one to them using \helpref{wxWindow::SetSizer}{wxwindowsetsizer} 
 and setting the auto-layout option to TRUE using 
 \helpref{wxWindow::SetAutoLayout}{wxwindowsetautolayout}. Here is one
 example showing how to add a notebook page that the notebook sizer is
