X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/78ee6a4750cc81d15182021a018d683cd05eb14f..df10208f26d2659e5995fd00debeb4eaa11174cc:/docs/latex/wx/threadh.tex

diff --git a/docs/latex/wx/threadh.tex b/docs/latex/wx/threadh.tex
index 729f51015c..a6eb570eae 100644
--- a/docs/latex/wx/threadh.tex
+++ b/docs/latex/wx/threadh.tex
@@ -16,7 +16,7 @@ Ordinarily, a \helpref{wxThread}{wxthread} derived object would be created
 with the calculation code implemented in
 \helpref{wxThread::Entry}{wxthreadentry}.  To access the inputs to the
 calculation, the frame object would often to pass a pointer to itself to the
-thread object.  Similiarly, the frame object would hold a pointer to the
+thread object.  Similarly, the frame object would hold a pointer to the
 thread object.  Shared data and synchronization objects could be stored in
 either object though the object without the data would have to access the
 data through a pointer.
@@ -36,7 +36,7 @@ None.
 
 \wxheading{See also}
 
-\helpref{wxThread}{wxthread}, \helpref{wxThreadHelperThread}{wxthreadhelperthread}
+\helpref{wxThread}{wxthread}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -46,13 +46,13 @@ None.
 
 This constructor simply initializes a member variable.
 
-\membersection{wxThreadHelper::m\_thread}
+\membersection{wxThreadHelper::m\_thread}\label{wxthreadhelpermthread}
 
 \member{wxThread *}{m\_thread}
 
 the actual \helpref{wxThread}{wxthread} object.
 
-\membersection{wxThread::\destruct{wxThreadHelper}}
+\membersection{wxThreadHelper::\destruct{wxThreadHelper}}\label{wxthreadhelperdtor}
 
 \func{}{\destruct{wxThreadHelper}}{\void}
 
@@ -63,7 +63,7 @@ The destructor frees the resources associated with the thread.
 \func{wxThreadError}{Create}{\param{unsigned int }{stackSize = 0}}
 
 Creates a new thread. The thread object is created in the suspended state, and you
-should call \helpref{GetThread()->Run()}{wxthreadhelperthreadrun} to start running
+should call \helpref{GetThread()->Run()}{wxthreadrun} to start running
 it.  You may optionally specify the stack size to be allocated to it (Ignored on
 platforms that don't support setting it explicitly, eg. Unix).
 
@@ -89,7 +89,7 @@ The returned value is the thread exit code which is only useful for
 joinable threads and is the value returned by
 \helpref{GetThread()->Wait()}{wxthreadwait}.
 
-This function is called by wxWindows itself and should never be called
+This function is called by wxWidgets itself and should never be called
 directly.
 
 \membersection{wxThreadHelper::GetThread}\label{wxthreadhelpergetthread}
@@ -98,3 +98,4 @@ directly.
 
 This is a public function that returns the \helpref{wxThread}{wxthread} object
 associated with the thread.
+
