X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/77d47192a89f7142f93c103760c8cbb824ec961d..4d8b1e479121b861bc99830d2ebca248bc162468:/docs/latex/wx/log.tex

diff --git a/docs/latex/wx/log.tex b/docs/latex/wx/log.tex
index 448c359565..2fd6de0d1a 100644
--- a/docs/latex/wx/log.tex
+++ b/docs/latex/wx/log.tex
@@ -6,7 +6,7 @@
 %% Created:     some time ago
 %% RCS-ID:      $Id$
 %% Copyright:   (c) 1997-2001 Vadim Zeitlin
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxLog}}\label{wxlog}
@@ -215,7 +215,7 @@ Returns the pointer to the active log target (may be NULL).
 \func{static wxLog *}{SetActiveTarget}{\param{wxLog * }{ logtarget}}
 
 Sets the specified log target as the active one. Returns the pointer to the
-previous active log target (may be NULL).  To supress logging use a new
+previous active log target (may be NULL).  To suppress logging use a new
 instance of wxLogNull not NULL.  If the active log target is set to NULL a
 new default log target will be created when logging occurs.
 
@@ -652,7 +652,7 @@ caller previously.
 
 \wxheading{See also}
 
-\helpref{wxLogTextCtrl}{wxlogtextctrl},\\
+\helpref{wxTextCtrl}{wxtextctrl},\\
 \helpref{wxStreamToTextRedirector}{wxstreamtotextredirector}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
