X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7775e41fd7da98d2b3af5b545d66b1efe10a4069..e9f4f51d06f536fadacb1796fa124728f50674d2:/docs/latex/wx/bufferdc.tex?ds=sidebyside

diff --git a/docs/latex/wx/bufferdc.tex b/docs/latex/wx/bufferdc.tex
index 5bf6fcf486..31058d7500 100644
--- a/docs/latex/wx/bufferdc.tex
+++ b/docs/latex/wx/bufferdc.tex
@@ -6,7 +6,7 @@
 %% Created:     07.02.04
 %% RCS-ID:      $Id$
 %% Copyright:   (c) 2004 Vadim Zeitlin
-%% License:     wxWindows license
+%% License:     wxWidgets license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxBufferedDC}}\label{wxbuffereddc}
@@ -59,7 +59,7 @@ flushed to this DC when this object is destroyed.  You may pass NULL
 in order to just initialize the buffer, and not flush it.}
 
 \docparam{area}{The size of the bitmap to be used for buffering (this bitmap is
-created internally when it is not given explicitely).}
+created internally when it is not given explicitly).}
 
 \docparam{buffer}{Explicitly provided bitmap to be used for buffering: this is
 the most efficient solution as the bitmap doesn't have to be recreated each
