X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/76e1c2debfe9558f79ab7c6cd2be1afc8b9d42c1..e490e26798196f61e9aa7fd668ed6489b5c203a5:/docs/latex/wx/validatr.tex?ds=sidebyside

diff --git a/docs/latex/wx/validatr.tex b/docs/latex/wx/validatr.tex
index a8d9d9b0d3..0a725ccc74 100644
--- a/docs/latex/wx/validatr.tex
+++ b/docs/latex/wx/validatr.tex
@@ -19,7 +19,7 @@ To specify a default, `null' validator, use the symbol {\bf wxDefaultValidator}.
 For more information, please see \helpref{Validator overview}{validatoroverview}.
 
 \pythonnote{If you wish to create a validator class in wxPython you should
-derive the class from \tt{wxPyValidator} in order to get Python-aware
+derive the class from {\tt wxPyValidator} in order to get Python-aware
 capabilities for the various virtual methods.}
 
 \wxheading{Derived from}
@@ -33,11 +33,10 @@ capabilities for the various virtual methods.}
 
 \wxheading{See also}
 
-\helpref{Validator overview}{validatoroverview},
-\helpref{wxTextValidator}{wxtextvalidator},
+\helpref{Validator overview}{validatoroverview}, 
+\helpref{wxTextValidator}{wxtextvalidator}, 
 \helpref{wxGenericValidator}{wxgenericvalidator},
 
-
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxValidator::wxValidator}\label{wxvalidatorconstr}
@@ -54,7 +53,7 @@ Destructor.
 
 \membersection{wxValidator::Clone}\label{wxvalidatorclone}
 
-\constfunc{virtual wxValidator*}{Clone}{\void}
+\constfunc{virtual wxObject*}{Clone}{\void}
 
 All validator classes must implement the {\bf Clone} function, which returns
 an identical copy of itself. This is because validators are passed to control
@@ -73,7 +72,7 @@ Returns the window associated with the validator.
 
 \membersection{wxValidator::SetBellOnError}{wxvalidatorsetbellonerror}
 
-\func{void}{SetBellOnError}{\param{bool}{ doIt = TRUE}}
+\func{void}{SetBellOnError}{\param{bool}{ doIt = true}}
 
 This functions switches on or turns off the error sound produced by the
 validators if an invalid key is pressed.
@@ -89,20 +88,19 @@ Associates a window with the validator.
 \func{virtual bool}{TransferToWindow}{}
 
 This overridable function is called when the value in the window must be
-transferred to the validator. Return FALSE if there is a problem.
+transferred to the validator. Return false if there is a problem.
 
 \membersection{wxValidator::TransferToWindow}\label{wxvalidatortransfertowindow}
 
 \func{virtual bool}{TransferToWindow}{}
 
 This overridable function is called when the value associated with the validator must be
-transferred to the window. Return FALSE if there is a problem.
+transferred to the window. Return false if there is a problem.
 
 \membersection{wxValidator::Validate}\label{wxvalidatorvalidate}
 
 \func{virtual bool}{Validate}{\param{wxWindow*}{ parent}}
 
 This overridable function is called when the value in the associated window must be validated.
-Return FALSE if the value in the window is not valid; you may pop up an error dialog.
-
+Return false if the value in the window is not valid; you may pop up an error dialog.
 
