X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/76e1c2debfe9558f79ab7c6cd2be1afc8b9d42c1..c663fbea6851207b4e0ac3e362868c23b1494a46:/docs/latex/wx/valgen.tex

diff --git a/docs/latex/wx/valgen.tex b/docs/latex/wx/valgen.tex
index a6d8c7a504..d5a9c9b76d 100644
--- a/docs/latex/wx/valgen.tex
+++ b/docs/latex/wx/valgen.tex
@@ -73,13 +73,13 @@ Clones the generic validator using the copy constructor.
 
 \membersection{wxGenericValidator::TransferFromWindow}\label{wxgenericvalidatortransferfromwindow}
 
-\func{virtual bool}{TransferToWindow}{}
+\func{virtual bool}{TransferFromWindow}{}
 
-Transfers the value to the window.
+Transfers the value from the window to the appropriate data type.
 
 \membersection{wxGenericValidator::TransferToWindow}\label{wxgenericvalidatortransfertowindow}
 
 \func{virtual bool}{TransferToWindow}{}
 
-Transfers the window value to the appropriate data type.
+Transfers the value to the window.
 
