X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/76e1c2debfe9558f79ab7c6cd2be1afc8b9d42c1..afbe906abdf9aa69a56571b8b20b095351dd8f34:/docs/latex/wx/validatr.tex

diff --git a/docs/latex/wx/validatr.tex b/docs/latex/wx/validatr.tex
index a8d9d9b0d3..765c4d2084 100644
--- a/docs/latex/wx/validatr.tex
+++ b/docs/latex/wx/validatr.tex
@@ -19,7 +19,7 @@ To specify a default, `null' validator, use the symbol {\bf wxDefaultValidator}.
 For more information, please see \helpref{Validator overview}{validatoroverview}.
 
 \pythonnote{If you wish to create a validator class in wxPython you should
-derive the class from \tt{wxPyValidator} in order to get Python-aware
+derive the class from {\tt wxPyValidator} in order to get Python-aware
 capabilities for the various virtual methods.}
 
 \wxheading{Derived from}
@@ -33,11 +33,10 @@ capabilities for the various virtual methods.}
 
 \wxheading{See also}
 
-\helpref{Validator overview}{validatoroverview},
-\helpref{wxTextValidator}{wxtextvalidator},
+\helpref{Validator overview}{validatoroverview}, 
+\helpref{wxTextValidator}{wxtextvalidator}, 
 \helpref{wxGenericValidator}{wxgenericvalidator},
 
-
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxValidator::wxValidator}\label{wxvalidatorconstr}
@@ -54,7 +53,7 @@ Destructor.
 
 \membersection{wxValidator::Clone}\label{wxvalidatorclone}
 
-\constfunc{virtual wxValidator*}{Clone}{\void}
+\constfunc{virtual wxObject*}{Clone}{\void}
 
 All validator classes must implement the {\bf Clone} function, which returns
 an identical copy of itself. This is because validators are passed to control
@@ -105,4 +104,3 @@ transferred to the window. Return FALSE if there is a problem.
 This overridable function is called when the value in the associated window must be validated.
 Return FALSE if the value in the window is not valid; you may pop up an error dialog.
 
-
