X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/76e1c2debfe9558f79ab7c6cd2be1afc8b9d42c1..4d85bcd1f59a00ff4d626f0acc0b24474ec1aa09:/docs/latex/wx/listctrl.tex

diff --git a/docs/latex/wx/listctrl.tex b/docs/latex/wx/listctrl.tex
index 2d74590a74..ba963b06b5 100644
--- a/docs/latex/wx/listctrl.tex
+++ b/docs/latex/wx/listctrl.tex
@@ -376,6 +376,10 @@ giving details in {\it flags}. {\it flags} will be a combination of the followin
 wxLIST\_HITTEST\_ONITEMSTATEICON.}
 \end{twocollist}
 
+\pythonnote{A tuple of values is returned in the wxPython version of
+thsi method.  The first value is the item id and the second is the
+flags value mentioned above.}
+
 \membersection{wxListCtrl::InsertColumn}\label{wxlistctrlinsertcolumn}
 
 \func{long}{InsertColumn}{\param{long }{col}, \param{wxListItem\& }{info}}
