X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/76e1c2debfe9558f79ab7c6cd2be1afc8b9d42c1..3e469ea37f1edbd6b2b6a0cbc43a3314c337e6f9:/docs/latex/wx/sizer.tex

diff --git a/docs/latex/wx/sizer.tex b/docs/latex/wx/sizer.tex
index c588beb1eb..47e9cf0302 100644
--- a/docs/latex/wx/sizer.tex
+++ b/docs/latex/wx/sizer.tex
@@ -1,7 +1,7 @@
 \section{\class{wxSizer}}\label{wxsizer}
 
 wxSizer is the abstract base class used for laying out subwindows in a window. You
-cannot use wxSizer directly; instead, you'll have to use \helpref{wxBoxSizer}{wxboxsizer}
+cannot use wxSizer directly; instead, you'll have to use \helpref{wxBoxSizer}{wxboxsizer} 
 or \helpref{wxStaticBoxSizer}{wxstaticboxsizer}.
 
 The layout algorithm used by sizers in wxWindows closely related to layout
@@ -77,7 +77,7 @@ to indicate if a child of a sizer can change its size in the main orientation of
 0 stands for not changable and a value of more than zero in interpreted relative to the value of other
 children of the same wxBoxSizer. You might, e.g., have a horizontal wxBoxSizer with three children, two
 of which are supposed to change their size with the sizer, then the two stretchable windows would get a
-value of 1 each to make them grow and shrink equally with the sizer's vertical dimension.}
+value of 1 each to make them grow and shrink equally with the sizer's horizontal dimension.}
 
 \docparam{flag}{This parameter can be used to set a number of flags which can be combined using
 the binary OR operator |. Two main behaviours are defined using these flags: One is the border
@@ -89,7 +89,7 @@ if you created a wxBoxSizer with the wxVERTICAL option, these flags will be rele
 sizer changes its horizontal size. A child may get resized to completely fill out the new size (using
 either wxGROW or wxEXPAND), may get centered (wxCENTER or wxCENTRE) or may get aligned to either
 side (wxALIGN\_LEFT and wxALIGN\_TOP are set to 0 and thus represent the default, wxALIGN\_RIGHT and
-wxALIGN\_BOTTOM have their obvious meaning.}
+wxALIGN\_BOTTOM have their obvious meaning).}
 
 \docparam{border}{Determines the border width, if the {\it flag} parameter is set to any border.}
 
