X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/76b566d03fa5a5988f17f31773a2facbda632dfa..7b28757f5e64bac68d9b159240616fc4d9ad66bc:/docs/latex/wx/htmlhlpf.tex

diff --git a/docs/latex/wx/htmlhlpf.tex b/docs/latex/wx/htmlhlpf.tex
index 9438e7a16d..af4ebdc9b7 100644
--- a/docs/latex/wx/htmlhlpf.tex
+++ b/docs/latex/wx/htmlhlpf.tex
@@ -28,12 +28,11 @@ location of .hhp file.
 Charset=@rfc_charset@
 \end{verbatim}
 
-which specifies what charset (e.g. "iso8859_1") was used in contents
+which specifies what charset (e.g. "iso8859\_1") was used in contents
 and index files. Please note that this line is incompatible with
 MS HTML Help Workshop and it would either silently remove it or complain
 with some error. See also 
-\helpref{Writing non-English applications.}{nonenglishoverview}
-
+\helpref{Writing non-English applications}{nonenglishoverview}.
 
 \wxheading{Contents file (.hhc)}
 
