X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/764471557e06c8816b8cc8eb9924a1e3c78509d8..8de93aba534eb8b9b7bf6b068e0a1e89e415cf97:/docs/latex/wx/strmmem.tex

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index c2b85338cb..ec70a884fb 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -5,12 +5,17 @@
 
 \wxheading{Derived from}
 
-\helpref{wxInputStream}{wxinputstream}
+\helpref{wxInputStream}{wxinputstream}\\
+\helpref{wxStreamBase}{wxstreambase}
 
 \wxheading{Include files}
 
 <wx/mstream.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxStreamBuffer}{wxstreambuffer}, \helpref{wxMemoryOutputStream}{wxmemoutputstream}
@@ -63,12 +68,17 @@ for that stream.
 
 \wxheading{Derived from}
 
-\helpref{wxOutputStream}{wxoutputstream}
+\helpref{wxOutputStream}{wxoutputstream}\\
+\helpref{wxStreamBase}{wxstreambase}
 
 \wxheading{Include files}
 
 <wx/mstream.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxStreamBuffer}{wxstreambuffer}
