X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/75d9e502238df95fa53c0030b1fac0d4f43e4025..14ee8dcc838bbcb201b0c45de2e47d8bf67edd3c:/docs/latex/wx/listctrl.tex

diff --git a/docs/latex/wx/listctrl.tex b/docs/latex/wx/listctrl.tex
index 3bfc00c891..4e1b969eb9 100644
--- a/docs/latex/wx/listctrl.tex
+++ b/docs/latex/wx/listctrl.tex
@@ -55,6 +55,10 @@ mac.listctrl.always\_use\_generic \helpref{wxSystemOption}{wxsystemoptions} to
 
 <wx/listctrl.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{7cm}
