X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/750cefbca2741b1be65adcd5480dd85a2d049a6c..12a3f2275c94a345cf83abf5151db68391859623:/docs/latex/wx/wizard.tex?ds=sidebyside

diff --git a/docs/latex/wx/wizard.tex b/docs/latex/wx/wizard.tex
index 2ae93d6650..ebe73802ee 100644
--- a/docs/latex/wx/wizard.tex
+++ b/docs/latex/wx/wizard.tex
@@ -55,6 +55,7 @@ changed (this event can be vetoed).}
 \twocolitem{{\bf EVT\_WIZARD\_CANCEL(id, func)}}{The user attempted to cancel
 the wizard (this event may also be vetoed).}
 \twocolitem{{\bf EVT\_WIZARD\_HELP(id, func)}}{The wizard help button was pressed.}
+\twocolitem{{\bf EVT\_WIZARD\_FINISHED(id, func)}}{The wizard finished button was pressed.}
 \end{twocollist}%
 
 \wxheading{Extended styles}
@@ -134,9 +135,9 @@ also \helpref{GetBitmap}{wxwizardpagegetbitmap}.}
 \docparam{pos}{The position of the dialog, it will be centered on the screen
 by default.}
 
-\membersection{wxWizard::Fit}\label{wxwizardfit}
+\membersection{wxWizard::FitToPage}\label{wxwizardfittopage}
 
-\func{void}{Fit}{\param{const wxWizardPage* }{firstPage}}
+\func{void}{FittoPage}{\param{const wxWizardPage* }{firstPage}}
 
 Sets the page size to be big enough for all the pages accessible via the
 given {\it firstPage}, i.e. this page, its next page and so on.
@@ -160,6 +161,32 @@ Get the current page while the wizard is running. {\tt NULL} is returned if
 
 Returns the size available for the pages.
 
+\membersection{wxWizard::HasNextPage}\label{wxwizardhasnextpage}
+
+\func{virtual bool}{HasNextPage}{\param{wxWizardPage *}{page}}
+
+Return {\tt TRUE} if this page is not the last one in the wizard. The base
+class version implements this by calling 
+\helpref{page->GetNext}{wxwizardpagegetnext} but this could be undesirable if,
+for example, the pages are created on demand only.
+
+\wxheading{See also}
+
+\helpref{HasPrevPage}{wxwizardhasprevpage}
+
+\membersection{wxWizard::HasPrevPage}\label{wxwizardhasprevpage}
+
+\func{virtual bool}{HasPrevPage}{\param{wxWizardPage *}{page}}
+
+Return {\tt TRUE} if this page is not the last one in the wizard. The base
+class version implements this by calling 
+\helpref{page->GetPrev}{wxwizardpagegetprev} but this could be undesirable if,
+for example, the pages are created on demand only.
+
+\wxheading{See also}
+
+\helpref{HasNextPage}{wxwizardhasnextpage}
+
 \membersection{wxWizard::RunWizard}\label{wxwizardrunwizard}
 
 \func{bool}{RunWizard}{\param{wxWizardPage* }{firstPage}}
