X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/750b78ba359e7d30c7d3ad49d268923e986268cb..6703082ef036da3e3043e25f3f439bbc6208c65f:/docs/latex/wx/strmbase.tex?ds=sidebyside

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index f35be6e23c..243e5a48ef 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -3,10 +3,17 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxStreamBase}}\label{wxstreambase}
 
+This class is the base class of most stream related classes in wxWindows. It must
+not be used directly.
+
 \wxheading{Derived from}
 
 None
 
+\wxheading{Include files}
+
+<wx/stream.h>
+
 \wxheading{See also}
 
 \helpref{wxStreamBuffer}{wxstreambuffer}
@@ -32,57 +39,70 @@ Creates a dummy stream object. It doesn't do anything.
 
 Destructor.
 
+\membersection{wxStreamBase::IsOk}\label{wxstreambaseisok}
+
+\constfunc{wxStreamError}{IsOk}{\void}
+
+Returns TRUE if no error occurred on the stream.
+
+\wxheading{See also}
+
+\helpref{LastError}{wxstreambaselasterror}
+
 \membersection{wxStreamBase::LastError}\label{wxstreambaselasterror}
 
 \constfunc{wxStreamError}{LastError}{\void}
 
 This function returns the last error.
+
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{{\bf wxStream_NOERROR}}{No error occured.}
-\twocolitem{{\bf wxStream_EOF}}{An End-Of-File occured.}
-\twocolitem{{\bf wxStream_WRITE_ERR}}{A generic error occured on the last write call.}
-\twocolitem{{\bf wxStream_READ_ERR}}{A generic error occured on the last read call.}
+\twocolitem{{\bf wxSTREAM\_NO\_ERROR}}{No error occurred.}
+\twocolitem{{\bf wxSTREAM\_EOF}}{An End-Of-File occurred.}
+\twocolitem{{\bf wxSTREAM\_WRITE\_ERROR}}{A generic error occurred on the last write call.}
+\twocolitem{{\bf wxSTREAM\_READ\_ERROR}}{A generic error occurred on the last read call.}
 \end{twocollist}
 
-\membersection{wxStreamBase::StreamSize}
-\constfunc{size_t}{StreamSize}{\void}
+\membersection{wxStreamBase::OnSysRead}\label{wxstreambaseonsysread}
 
-This function returns the size of the stream. For example, for a file it is the size of
-the file).
+\func{size\_t}{OnSysRead}{\param{void*}{ buffer}, \param{size\_t}{ bufsize}}
 
-\wxheading{Warning}
+Internal function. It is called when the stream wants to read data of the
+specified size. It should return the size that was actually read.
 
-There are streams which do not have size by definition, such as socket streams.
-In that cases, StreamSize returns an invalid size represented by
-\begin{verbatim}
-~(size_t)0
-\end{verbatim}
+\membersection{wxStreamBase::OnSysSeek}
 
-\membersection{wxStreamBase::OnSysRead}\label{wxstreambaseonsysread}
+\func{off\_t}{OnSysSeek}{\param{off\_t}{ pos}, \param{wxSeekMode}{ mode}}
 
-\func{size_t}{OnSysRead}{\param{void*}{ buffer}, \param{size_t}{ bufsize}}
+Internal function. It is called when the stream needs to change the
+current position.
 
-Internal function. It is called when the stream buffer needs a buffer of the
-specified size. It should return the size that was actually read.
+\membersection{wxStreamBase::OnSysTell}
+
+\constfunc{off\_t}{OnSysTell}{\void}
+
+Internal function. Is is called when the stream needs to know the
+real position.
 
 \membersection{wxStreamBase::OnSysWrite}
 
-\func{size_t}{OnSysWrite}{\param{void *}{buffer}, \param{size_t}{ bufsize}}
+\func{size\_t}{OnSysWrite}{\param{void *}{buffer}, \param{size\_t}{ bufsize}}
 
 See \helpref{OnSysRead}{wxstreambaseonsysread}.
 
-\membersection{wxStreamBase::OnSysSeek}
+\membersection{wxStreamBase::GetSize}\label{wxstreambasegetsize}
 
-\func{off_t}{OnSysSeek}{\param{off_t}{ pos}, \param{wxSeekMode}{ mode}}
+\constfunc{size\_t}{GetSize}{\void}
 
-Internal function. It is called when the stream buffer needs to change the
-current position in the stream. See \helpref{wxStreamBuffer::Seek}{wxstreambufferseek}
+This function returns the size of the stream. For example, for a file it is the size of
+the file.
 
-\membersection{wxStreamBase::OnSysTell}
+\wxheading{Warning}
 
-\constfunc{off_t}{OnSysTell}{\void}
+There are streams which do not have size by definition, such as socket streams.
+In that cases, GetSize returns an invalid size represented by
 
-Internal function. Is is called when the stream buffer needs to know the
-real position in the stream.
+\begin{verbatim}
+~(size_t)0
+\end{verbatim}
 
