X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7468b994be5579ff57516f07e2d771831e73f65e..7946d7deaac081a745dc616a5eb13ae864865fa2:/docs/latex/wx/strmbase.tex?ds=sidebyside

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 1bcd9ec56b..243e5a48ef 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -39,17 +39,28 @@ Creates a dummy stream object. It doesn't do anything.
 
 Destructor.
 
+\membersection{wxStreamBase::IsOk}\label{wxstreambaseisok}
+
+\constfunc{wxStreamError}{IsOk}{\void}
+
+Returns TRUE if no error occurred on the stream.
+
+\wxheading{See also}
+
+\helpref{LastError}{wxstreambaselasterror}
+
 \membersection{wxStreamBase::LastError}\label{wxstreambaselasterror}
 
 \constfunc{wxStreamError}{LastError}{\void}
 
 This function returns the last error.
+
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{{\bf wxSTREAM\_NO\_ERROR}}{No error occured.}
-\twocolitem{{\bf wxSTREAM\_EOF}}{An End-Of-File occured.}
-\twocolitem{{\bf wxSTREAM\_WRITE\_ERROR}}{A generic error occured on the last write call.}
-\twocolitem{{\bf wxSTREAM\_READ\_ERROR}}{A generic error occured on the last read call.}
+\twocolitem{{\bf wxSTREAM\_NO\_ERROR}}{No error occurred.}
+\twocolitem{{\bf wxSTREAM\_EOF}}{An End-Of-File occurred.}
+\twocolitem{{\bf wxSTREAM\_WRITE\_ERROR}}{A generic error occurred on the last write call.}
+\twocolitem{{\bf wxSTREAM\_READ\_ERROR}}{A generic error occurred on the last read call.}
 \end{twocollist}
 
 \membersection{wxStreamBase::OnSysRead}\label{wxstreambaseonsysread}
@@ -84,7 +95,7 @@ See \helpref{OnSysRead}{wxstreambaseonsysread}.
 \constfunc{size\_t}{GetSize}{\void}
 
 This function returns the size of the stream. For example, for a file it is the size of
-the file).
+the file.
 
 \wxheading{Warning}
 
