X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/73862e49f4c478b5bdc373020f3a09db3f398f73..c52b96359b639cda516615f9433d3b20b35443b5:/docs/latex/wx/dc.tex

diff --git a/docs/latex/wx/dc.tex b/docs/latex/wx/dc.tex
index 151fb40af2..fdc1c815be 100644
--- a/docs/latex/wx/dc.tex
+++ b/docs/latex/wx/dc.tex
@@ -363,12 +363,11 @@ Draws lines using an array of {\it points} of size {\it n}
 adding the optional offset coordinate. The current pen is
 used for drawing the lines.
 
-\func{void}{DrawLines}{\param{const wxList *}{points}, \param{wxCoord}{ xoffset = 0}, \param{wxCoord}{ yoffset = 0}}
+\func{void}{DrawLines}{\param{const wxPointList *}{points}, \param{wxCoord}{ xoffset = 0}, \param{wxCoord}{ yoffset = 0}}
 
-This method is deprecated and will be removed or replaced
-with a type-safe version. It uses a wxList of pointers to
-wxPoints, adding the optional offset coordinate. The programmer
-is responsible for deleting the list of points.
+This method uses a list of wxPoints, adding the optional offset
+coordinate. The programmer is responsible for deleting the list
+of points.
 
 \pythonnote{The wxPython version of this method accepts a Python list
 of wxPoint objects.}
@@ -386,13 +385,11 @@ of wxPoint objects.}
 Draws a filled polygon using an array of {\it points} of size {\it n},
 adding the optional offset coordinate.
 
-\func{void}{DrawPolygon}{\param{const wxList *}{points}, \param{wxCoord}{ xoffset = 0}, \param{wxCoord}{ yoffset = 0},\\
+\func{void}{DrawPolygon}{\param{const wxPointList *}{points}, \param{wxCoord}{ xoffset = 0}, \param{wxCoord}{ yoffset = 0},\\
   \param{int }{fill\_style = wxODDEVEN\_RULE}}
 
-This method is deprecated and will be removed or replaced
-with a type-safe version. It draws a filled polygon using
-a list of pointers to wxPoints, adding  the optional offset
-coordinate.
+This method draws a filled polygon using a list of wxPoints,
+adding the optional offset coordinate.
 
 The last argument specifies the fill rule: {\bf wxODDEVEN\_RULE} (the
 default) or {\bf wxWINDING\_RULE}.
@@ -493,24 +490,6 @@ the strange effects X produces when the corners are too big for
 the rectangle.
 
 
-docs/latex/wx/dc.tex
-
-\membersection{wxDC::DrawScaledBitmap}\label{wxdcdrawscaledbitmap}
-
-\func{void}{DrawScaledBitmap}{\param{const wxBitmap\&}{ bitmap}, \param{wxCoord}{ x}, \param{wxCoord}{ y}, \param{wxCoord}{ w}, \param{wxCoord}{ h}, \param{bool}{ transparent}, \param{int}{ quality = wxIMAGE_QUALITY_NORMAL}}
-
-Draw a bitmap on the device context at the specified point and resize it to the specified size. If {\it transparent} is true and the bitmap has a transparency mask, the bitmap will be drawn transparently.
-
-Under wxGTK with Gtk Printing support, you should use this method with a wxPrinterDC if you want to print an image with a resolution higher than 72 dpi. On every other DC and platform, resizing is done using \helpref{wxImage::Rescale}{wximagerescale}.
-
-For a description of the {\it quality} parameter, see the \helpref{Scale}{wximagescale} function.
-
-When drawing a mono-bitmap, the current text foreground colour will be used to draw the foreground
-of the bitmap (all bits set to 1), and the current text background colour to draw the background
-(all bits set to 0). See also \helpref{SetTextForeground}{wxdcsettextforeground},
-\helpref{SetTextBackground}{wxdcsettextbackground} and \helpref{wxMemoryDC}{wxmemorydc}.
-
-
 \membersection{wxDC::DrawSpline}\label{wxdcdrawspline}
 
 \func{void}{DrawSpline}{\param{int }{n}, \param{wxPoint }{points[]}}
@@ -518,10 +497,9 @@ of the bitmap (all bits set to 1), and the current text background colour to dra
 Draws a spline between all given control points, using the current
 pen.
 
-\func{void}{DrawSpline}{\param{wxList *}{points}}
+\func{void}{DrawSpline}{\param{const wxPointList *}{points}}
 
-Draws a spline between all given control points, using the current
-pen.  Doesn't delete the wxList and contents.
+Draws a spline between all given control points.
 
 \func{void}{DrawSpline}{\param{wxCoord}{ x1}, \param{wxCoord}{ y1}, \param{wxCoord}{ x2}, \param{wxCoord}{ y2}, \param{wxCoord}{ x3}, \param{wxCoord}{ y3}}
 
@@ -655,6 +633,17 @@ rectangle are returned as a tuple.}
 {\tt ( x, y, width, height )}}
 
 
+\membersection{wxDC::GetDepth}\label{wxdcgetdepth}
+
+\constfunc{int}{GetDepth}{\void}
+
+Returns the depth (number of bits/pixel) of this DC.
+
+\wxheading{See also}
+
+\helpref{wxDisplayDepth}{wxdisplaydepth}
+
+
 \membersection{wxDC::GetFont}\label{wxdcgetfont}
 
 \constfunc{const wxFont\&}{GetFont}{\void}
@@ -1160,7 +1149,7 @@ The mapping mode can be one of the following:
 \twocolitem{wxMM\_POINTS}{Each logical unit is a point, or 1/72 of an inch.}
 \twocolitem{wxMM\_METRIC}{Each logical unit is 1 mm.}
 \twocolitem{wxMM\_LOMETRIC}{Each logical unit is 1/10 of a mm.}
-\twocolitem{wxMM\_TEXT}{Each logical unit is 1 pixel.}
+\twocolitem{wxMM\_TEXT}{Each logical unit is 1 device pixel.}
 \end{twocollist}
 
 
@@ -1173,7 +1162,7 @@ or bitmap associated with the DC. If the argument is wxNullPalette, the current
 palette is selected out of the device context, and the original palette
 restored.
 
-See \helpref{wxPalette}{wxpalette} for further details. 
+See \helpref{wxPalette}{wxpalette} for further details.
 
 
 \membersection{wxDC::SetPen}\label{wxdcsetpen}
