X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/7376079d095725be0fd5b1a105cbfecafc8b3576..d5706f3ee8a83947a639ff44a21df29c97b72682:/docs/latex/wx/odcbox.tex

diff --git a/docs/latex/wx/odcbox.tex b/docs/latex/wx/odcbox.tex
index a795860281..385326bf77 100644
--- a/docs/latex/wx/odcbox.tex
+++ b/docs/latex/wx/odcbox.tex
@@ -25,6 +25,7 @@ and \helpref{OnMeasureItemWidth()}{wxownerdrawncomboboxonmeasureitemwidth}.
 \wxheading{Derived from}
 
 \helpref{wxComboCtrl}{wxcomboctrl}\\
+\helpref{wxControlWithItems}{wxcontrolwithitems}\\
 \helpref{wxControl}{wxcontrol}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
