X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/733f486aac7f5d92f902d6041338cd6e1bc7d99d..1be9182df86e9a902fe9ab6edef960fdc449fed6:/docs/latex/wx/grid.tex?ds=sidebyside

diff --git a/docs/latex/wx/grid.tex b/docs/latex/wx/grid.tex
index a6d4685ab2..2b0375eba6 100644
--- a/docs/latex/wx/grid.tex
+++ b/docs/latex/wx/grid.tex
@@ -1620,7 +1620,7 @@ Vertical alignment should be one of wxALIGN\_TOP, wxALIGN\_CENTRE or wxALIGN\_BO
 
 Sets the height of the column labels.
 
-If \arg{height} equals to \textt{wxGRID\_AUTOSIZE} then height is calculated automatically
+If \arg{height} equals to \texttt{wxGRID\_AUTOSIZE} then height is calculated automatically
 so that no label is truncated. Note that this could be slow for a large table.
 
 
@@ -1862,7 +1862,7 @@ Vertical alignment should be one of wxALIGN\_TOP, wxALIGN\_CENTRE or wxALIGN\_BO
 
 Sets the width of the row labels.
 
-If \arg{width} equals \textt{wxGRID\_AUTOSIZE} then width is calculated automatically
+If \arg{width} equals \texttt{wxGRID\_AUTOSIZE} then width is calculated automatically
 so that no label is truncated. Note that this could be slow for a large table.
 
 
