X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/732e46f552027022e4dc87d013918c9d45b0f772..de414223ab83187113388a167dc5fa391cc9e166:/docs/latex/wx/sbsizer.tex

diff --git a/docs/latex/wx/sbsizer.tex b/docs/latex/wx/sbsizer.tex
index 6394efaffc..f6d8fb5975 100644
--- a/docs/latex/wx/sbsizer.tex
+++ b/docs/latex/wx/sbsizer.tex
@@ -1,8 +1,10 @@
 \section{\class{wxStaticBoxSizer}}\label{wxstaticboxsizer}
 
 wxStaticBoxSizer is a sizer derived from wxBoxSizer but adds a static
-box around the sizer. This static box has to be created independently or the
-sizer may create it itself as a convenience.
+box around the sizer. This static box may be either created independently or
+the sizer may create it itself as a convenience. In any case, the sizer owns
+the \helpref{wxStaticBox}{wxstaticbox} control and will delete it if it is
+deleted.
 
 \wxheading{Derived from}
 
@@ -14,6 +16,10 @@ sizer may create it itself as a convenience.
 
 <wx/sizer.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxSizer}{wxsizer}, \helpref{wxStaticBox}{wxstaticbox}, \helpref{wxBoxSizer}{wxboxsizer}, \helpref{Sizer overview}{sizeroverview}
