X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/72045d5768a126191a907bc640c28e81a11afdd6..bf7f7793e9c6e2fc3fcb8297ab7b3b56e3e9eea2:/docs/latex/wx/animation.tex

diff --git a/docs/latex/wx/animation.tex b/docs/latex/wx/animation.tex
index 298c9f1df4..9e3e6df825 100644
--- a/docs/latex/wx/animation.tex
+++ b/docs/latex/wx/animation.tex
@@ -68,7 +68,7 @@ data be deleted.
 
 \membersection{wxAnimation::GetDelay}\label{wxanimationgetdelay}
 
-\constfunc{int}{GetDelay}{\param{size_t }{i}}
+\constfunc{int}{GetDelay}{\param{size\_t }{i}}
 
 Returns the delay for the i-th frame in milliseconds.
 If {\tt -1} is returned the frame is to be displayed forever.
@@ -76,14 +76,14 @@ If {\tt -1} is returned the frame is to be displayed forever.
 
 \membersection{wxAnimation::GetFrameCount}\label{wxanimationgetframecount}
 
-\constfunc{size_t}{GetFrameCount}{\void}
+\constfunc{size\_t}{GetFrameCount}{\void}
 
 Returns the number of frames for this animation.
 
 
 \membersection{wxAnimation::GetFrame}\label{wxanimationgetframe}
 
-\constfunc{wxImage}{GetFrame}{\param{size_t }{i}}
+\constfunc{wxImage}{GetFrame}{\param{size\_t }{i}}
 
 Returns the i-th frame as a \helpref{wxImage}{wximage}.
 
